Muons in erbium (Er)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
68 (Er) 167.259(3)  9.026  658.0 0.24823 2.5573 0.0658 3.4932 5.9565  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.125  4.125  1.396 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.277  3.277  2.494 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.601  2.601  4.571 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.048  2.048  8.959 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.764  1.764  1.425 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.349  1.349  4.097 × 10^{1}
100. MeV 1.764 × 10^{2} 1.275  1.275  5.626 × 10^{1}
140. MeV 2.218 × 10^{2} 1.205  1.205  8.866 × 10^{1}
200. MeV 2.868 × 10^{2} 1.172  1.172  1.393 × 10^{2}
237. MeV 3.260 × 10^{2} 1.168  0.000  1.169 Minimum ionization
300. MeV 3.917 × 10^{2} 1.173  0.000  0.000  1.174  2.248 × 10^{2}
400. MeV 4.945 × 10^{2} 1.193  0.000  0.000  1.193  3.093 × 10^{2}
800. MeV 8.995 × 10^{2} 1.276  0.001  0.000  1.277  6.329 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.309  0.001  0.000  1.311  7.874 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.362  0.002  0.000  0.001  1.365  1.086 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.420  0.003  0.001  0.001  1.426  1.515 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.486  0.006  0.003  0.001  1.497  2.199 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.531  0.009  0.006  0.002  1.548  2.855 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.635  0.022  0.020  0.003  1.680  5.325 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.666  0.029  0.028  0.004  1.728  6.499 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.711  0.044  0.046  0.005  1.807  8.761 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.755  0.068  0.076  0.007  1.908  1.199 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.803  0.112  0.132  0.011  2.059  1.703 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.834  0.158  0.195  0.014  2.202  2.173 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.903  0.358  0.469  0.028  2.760  3.791 × 10^{4}
100. GeV 1.001 × 10^{5} 1.924  0.464  0.617  0.035  3.041  4.481 × 10^{4}
140. GeV 1.401 × 10^{5} 1.954  0.681  0.921  0.049  3.606  5.688 × 10^{4}
163. GeV 1.630 × 10^{5} 1.967  0.809  1.102  0.057  3.936 Muon critical energy
200. GeV 2.001 × 10^{5} 1.985  1.020  1.403  0.070  4.479  7.179 × 10^{4}
300. GeV 3.001 × 10^{5} 2.019  1.600  2.208  0.104  5.933  9.114 × 10^{4}
400. GeV 4.001 × 10^{5} 2.043  2.199  3.042  0.139  7.424  1.062 × 10^{5}
800. GeV 8.001 × 10^{5} 2.101  4.670  6.461  0.281  13.515  1.456 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.120  5.939  8.210  0.353  16.624  1.589 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.149  8.482  11.697  0.500  22.830  1.793 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.180  12.371  17.018  0.723  32.294  2.013 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.215  18.861  25.861  1.106  48.044  2.266 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.241  25.436  34.796  1.494  63.968  2.445 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.304  51.934  70.711  3.102 128.053  2.879 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.325  65.284  88.762  3.928 160.300  3.018 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.356  91.911 124.781  5.622 224.673  3.228 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.390 132.080 179.038  8.218 321.728  3.450 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.430 198.951 269.308  12.700 483.391  3.702 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.458 266.054 359.789  17.286 645.589  3.880 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.528 534.841 721.955  36.427 1295.754  4.309 × 10^{5}
100. TeV 1.000 × 10^{8} 2.551 669.450 903.200  46.310 1621.513  4.446 × 10^{5}