Muons in dimethyl sulfoxide (CH_{3})_{2}SO

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.53757 & 1.101 & 98.6 & 0.06619 & 3.5708 & 0.2021 & 3.1263 & 3.9844 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.440  7.440  7.447 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.812  5.812  1.359 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.545  4.545  2.540 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.531  3.531  5.071 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.017  3.018  8.155 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.270  2.270  2.392 × 10^{1}
100. MeV 1.764 × 10^{2} 2.135  2.135  3.303 × 10^{1}
140. MeV 2.218 × 10^{2} 1.993  1.993  5.251 × 10^{1}
200. MeV 2.868 × 10^{2} 1.914  1.914  8.334 × 10^{1}
300. MeV 3.917 × 10^{2} 1.887  0.000  1.888  1.361 × 10^{2}
300. MeV 3.919 × 10^{2} 1.887  0.000  1.888 Minimum ionization
400. MeV 4.945 × 10^{2} 1.897  0.000  1.898  1.890 × 10^{2}
800. MeV 8.995 × 10^{2} 1.979  0.000  0.000  1.979  3.954 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.014  0.000  0.000  2.015  4.955 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.072  0.000  0.000  0.001  2.073  6.911 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.135  0.001  0.000  0.001  2.137  9.759 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.207  0.001  0.001  0.001  2.210  1.435 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.256  0.002  0.002  0.002  2.262  1.882 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.369  0.005  0.005  0.004  2.383  3.600 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.403  0.006  0.006  0.005  2.421  4.432 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.453  0.010  0.011  0.006  2.480  6.064 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.502  0.015  0.017  0.009  2.544  8.451 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.555  0.025  0.030  0.013  2.624  1.232 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.591  0.035  0.045  0.017  2.688  1.608 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.673  0.079  0.107  0.034  2.894  3.040 × 10^{4}
100. GeV 1.001 × 10^{5} 2.698  0.103  0.141  0.042  2.985  3.720 × 10^{4}
140. GeV 1.401 × 10^{5} 2.736  0.152  0.212  0.058  3.158  5.023 × 10^{4}
200. GeV 2.001 × 10^{5} 2.775  0.228  0.323  0.082  3.409  6.851 × 10^{4}
300. GeV 3.001 × 10^{5} 2.820  0.359  0.513  0.123  3.816  9.622 × 10^{4}
400. GeV 4.001 × 10^{5} 2.852  0.495  0.710  0.164  4.222  1.211 × 10^{5}
800. GeV 8.001 × 10^{5} 2.929  1.061  1.527  0.332  5.848  2.013 × 10^{5}
802. GeV 8.025 × 10^{5} 2.929  1.064  1.532  0.333  5.858 Muon critical energy
1.00 TeV 1.000 × 10^{6} 2.954  1.352  1.947  0.417  6.670  2.333 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.992  1.939  2.785  0.591  8.307  2.869 × 10^{5}
2.00 TeV 2.000 × 10^{6} 3.033  2.839  4.068  0.856  10.796  3.501 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.080  4.346  6.202  1.311  14.939  4.285 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.114  5.878  8.364  1.773  19.129  4.875 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.197  12.073  17.067  3.700  36.037  6.374 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.224  15.203  21.448  4.692  44.567  6.872 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.266  21.453  30.179  6.734  61.632  7.633 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.311  30.901  43.343  9.872  87.428  8.446 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.363  46.620  65.252  15.314 130.550  9.376 × 10^{5}
40.0 TeV 4.000 × 10^{7} 3.401  62.415  87.227  20.898 173.941  1.004 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.494 125.746 175.196  44.321 348.758  1.163 × 10^{6}
100. TeV 1.000 × 10^{8} 3.524 157.493 219.230  56.458 436.705  1.214 × 10^{6}