Muons in diethyl ether [(CH_{3}CH_{2})_{2}O]

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.56663 & 0.714 & 60.0 & 0.10550 & 3.4586 & 0.2231 & 2.6745 & 3.3721 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 8.365  8.365  6.594 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 6.518  6.518  1.207 × 10^{0}
20.0 MeV 6.802 × 10^{1} 5.085  5.086  2.261 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.941  3.941  4.526 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.363  3.363  7.291 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.521  2.521  2.147 × 10^{1}
100. MeV 1.764 × 10^{2} 2.370  2.370  2.967 × 10^{1}
140. MeV 2.218 × 10^{2} 2.205  2.205  4.725 × 10^{1}
200. MeV 2.868 × 10^{2} 2.110  2.110  7.518 × 10^{1}
300. MeV 3.917 × 10^{2} 2.072  0.000  2.073  1.231 × 10^{2}
324. MeV 4.161 × 10^{2} 2.072  0.000  2.072 Minimum ionization
400. MeV 4.945 × 10^{2} 2.077  0.000  2.078  1.714 × 10^{2}
800. MeV 8.995 × 10^{2} 2.152  0.000  0.000  2.153  3.606 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.187  0.000  0.000  2.188  4.527 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.243  0.000  0.001  2.244  6.331 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.306  0.000  0.000  0.001  2.307  8.966 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.377  0.001  0.001  0.001  2.379  1.323 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.426  0.001  0.001  0.002  2.430  1.739 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.539  0.003  0.003  0.004  2.549  3.341 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.573  0.004  0.004  0.005  2.586  4.120 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.623  0.006  0.007  0.007  2.643  5.649 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.674  0.009  0.011  0.009  2.703  7.892 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.728  0.016  0.019  0.014  2.776  1.154 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.765  0.022  0.028  0.018  2.833  1.510 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.851  0.050  0.068  0.035  3.004  2.879 × 10^{4}
100. GeV 1.001 × 10^{5} 2.877  0.065  0.089  0.043  3.075  3.537 × 10^{4}
140. GeV 1.401 × 10^{5} 2.917  0.097  0.134  0.060  3.208  4.810 × 10^{4}
200. GeV 2.001 × 10^{5} 2.959  0.146  0.206  0.085  3.395  6.628 × 10^{4}
300. GeV 3.001 × 10^{5} 3.006  0.230  0.328  0.127  3.691  9.451 × 10^{4}
400. GeV 4.001 × 10^{5} 3.039  0.318  0.455  0.169  3.981  1.206 × 10^{5}
800. GeV 8.001 × 10^{5} 3.120  0.685  0.985  0.341  5.131  2.088 × 10^{5}
1.00 TeV 1.000 × 10^{6} 3.146  0.875  1.259  0.429  5.709  2.458 × 10^{5}
1.22 TeV 1.221 × 10^{6} 3.170  1.084  1.558  0.527  6.341 Muon critical energy
1.40 TeV 1.400 × 10^{6} 3.187  1.257  1.805  0.608  6.857  3.096 × 10^{5}
2.00 TeV 2.000 × 10^{6} 3.230  1.845  2.643  0.881  8.599  3.876 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.279  2.832  4.037  1.350  11.499  4.879 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.315  3.837  5.453  1.827  14.431  5.653 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.403  7.909  11.154  3.815  26.281  7.678 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.432  9.970  14.027  4.839  32.268  8.363 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.476  14.084  19.749  6.951  44.260  9.418 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.523  20.311  28.382  10.196  62.413  1.055 × 10^{6}
30.0 TeV 3.000 × 10^{7} 3.578  30.680  42.744  15.832  92.836  1.186 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.618  41.110  57.154  21.619 123.502  1.279 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.716  82.932 114.845  45.921 247.413  1.503 × 10^{6}
100. TeV 1.000 × 10^{8} 3.748 103.900 143.725  58.525 309.898  1.576 × 10^{6}