Muons in dichlorodiethyl ether C_{4}Cl_{2}H_{8}O

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.51744 & 1.220 & 103.3 & 0.06799 & 3.5250 & 0.1773 & 3.1586 & 4.0135 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.117  7.117  7.789 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.561  5.561  1.421 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.349  4.349  2.655 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.380  3.380  5.300 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.889  2.889  8.521 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.174  2.174  2.499 × 10^{1}
100. MeV 1.764 × 10^{2} 2.042  2.042  3.450 × 10^{1}
140. MeV 2.218 × 10^{2} 1.907  1.907  5.486 × 10^{1}
200. MeV 2.868 × 10^{2} 1.832  1.832  8.708 × 10^{1}
298. MeV 3.894 × 10^{2} 1.807  0.000  1.807 Minimum ionization
300. MeV 3.917 × 10^{2} 1.807  0.000  1.807  1.422 × 10^{2}
400. MeV 4.945 × 10^{2} 1.817  0.000  1.817  1.974 × 10^{2}
800. MeV 8.995 × 10^{2} 1.895  0.000  0.000  1.896  4.129 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.930  0.000  0.000  1.931  5.174 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.986  0.001  0.000  0.001  1.987  7.215 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.047  0.001  0.000  0.001  2.049  1.019 × 10^{3}
3.00 GeV 3.104 × 10^{3} 2.116  0.001  0.001  0.001  2.120  1.498 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.165  0.002  0.002  0.002  2.170  1.964 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.274  0.005  0.005  0.004  2.288  3.753 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.307  0.007  0.007  0.005  2.326  4.619 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.355  0.010  0.011  0.006  2.383  6.317 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.403  0.016  0.019  0.009  2.447  8.800 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.454  0.027  0.033  0.013  2.527  1.282 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.489  0.038  0.048  0.017  2.592  1.672 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.568  0.085  0.115  0.033  2.802  3.154 × 10^{4}
100. GeV 1.001 × 10^{5} 2.592  0.110  0.152  0.041  2.896  3.856 × 10^{4}
140. GeV 1.401 × 10^{5} 2.628  0.163  0.228  0.057  3.077  5.196 × 10^{4}
200. GeV 2.001 × 10^{5} 2.666  0.244  0.348  0.081  3.341  7.067 × 10^{4}
300. GeV 3.001 × 10^{5} 2.709  0.385  0.551  0.122  3.768  9.883 × 10^{4}
400. GeV 4.001 × 10^{5} 2.740  0.530  0.762  0.163  4.195  1.240 × 10^{5}
730. GeV 7.297 × 10^{5} 2.804  1.026  1.479  0.299  5.608 Muon critical energy
800. GeV 8.001 × 10^{5} 2.814  1.134  1.635  0.329  5.912  2.039 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.838  1.445  2.084  0.413  6.781  2.355 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.875  2.072  2.980  0.586  8.512  2.880 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.914  3.032  4.350  0.848  11.145  3.495 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.959  4.640  6.630  1.299  15.529  4.252 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.992  6.274  8.939  1.757  19.963  4.818 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.072  12.880  18.232  3.665  37.850  6.249 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.099  16.217  22.909  4.647  46.873  6.723 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.139  22.879  32.231  6.670  64.919  7.445 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.182  32.949  46.286  9.775  92.192  8.217 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.232  49.700  69.678  15.160 137.771  9.099 × 10^{5}
40.0 TeV 4.000 × 10^{7} 3.269  66.529  93.140  20.685 183.623  9.725 × 10^{5}
80.0 TeV 8.000 × 10^{7} 3.358 134.000 187.059  43.847 368.264  1.123 × 10^{6}
100. TeV 1.000 × 10^{8} 3.387 167.818 234.069  55.844 461.119  1.172 × 10^{6}