Muons in cyclohexane (C_{6}H_{12})

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.57034 & 0.779 & 56.4 & 0.12035 & 3.4278 & 0.1728 & 2.5549 & 3.1544 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 8.485  8.485  6.497 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 6.610  6.610  1.189 × 10^{0}
20.0 MeV 6.802 × 10^{1} 5.156  5.156  2.229 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.995  3.995  4.464 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.408  3.408  7.192 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.553  2.553  2.119 × 10^{1}
100. MeV 1.764 × 10^{2} 2.392  2.392  2.930 × 10^{1}
140. MeV 2.218 × 10^{2} 2.225  2.225  4.672 × 10^{1}
200. MeV 2.868 × 10^{2} 2.128  2.128  7.440 × 10^{1}
300. MeV 3.917 × 10^{2} 2.089  0.000  2.089  1.220 × 10^{2}
328. MeV 4.211 × 10^{2} 2.087  0.000  2.088 Minimum ionization
400. MeV 4.945 × 10^{2} 2.093  0.000  2.093  1.698 × 10^{2}
800. MeV 8.995 × 10^{2} 2.166  0.000  0.000  2.166  3.578 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.200  0.000  0.000  2.201  4.494 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.256  0.000  0.001  2.257  6.288 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.317  0.000  0.000  0.001  2.319  8.908 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.388  0.001  0.000  0.001  2.390  1.315 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.436  0.001  0.001  0.002  2.440  1.729 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.549  0.003  0.003  0.004  2.558  3.325 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.583  0.004  0.004  0.005  2.595  4.101 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.633  0.006  0.006  0.007  2.651  5.625 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.683  0.009  0.010  0.009  2.711  7.861 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.738  0.015  0.018  0.014  2.784  1.150 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.775  0.021  0.026  0.018  2.840  1.505 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.861  0.047  0.063  0.035  3.007  2.872 × 10^{4}
100. GeV 1.001 × 10^{5} 2.888  0.061  0.084  0.043  3.076  3.529 × 10^{4}
140. GeV 1.401 × 10^{5} 2.928  0.091  0.126  0.060  3.204  4.803 × 10^{4}
200. GeV 2.001 × 10^{5} 2.970  0.137  0.193  0.085  3.385  6.624 × 10^{4}
300. GeV 3.001 × 10^{5} 3.017  0.216  0.307  0.127  3.668  9.461 × 10^{4}
400. GeV 4.001 × 10^{5} 3.051  0.299  0.427  0.170  3.946  1.209 × 10^{5}
800. GeV 8.001 × 10^{5} 3.132  0.644  0.925  0.343  5.044  2.103 × 10^{5}
1.00 TeV 1.000 × 10^{6} 3.159  0.822  1.183  0.430  5.595  2.479 × 10^{5}
1.29 TeV 1.287 × 10^{6} 3.189  1.079  1.550  0.559  6.378 Muon critical energy
1.40 TeV 1.400 × 10^{6} 3.199  1.182  1.697  0.611  6.689  3.132 × 10^{5}
2.00 TeV 2.000 × 10^{6} 3.243  1.736  2.485  0.884  8.348  3.934 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.293  2.665  3.799  1.355  11.112  4.969 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.329  3.612  5.132  1.834  13.907  5.772 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.417  7.450  10.502  3.831  25.201  7.878 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.446  9.393  13.208  4.860  30.908  8.594 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.490  13.272  18.599  6.982  42.344  9.695 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.538  19.144  26.732  10.243  59.658  1.088 × 10^{6}
30.0 TeV 3.000 × 10^{7} 3.594  28.924  40.262  15.907  88.687  1.225 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.633  38.762  53.838  21.722 117.955  1.322 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.732  78.203 108.188  46.153 236.276  1.557 × 10^{6}
100. TeV 1.000 × 10^{8} 3.764  97.977 135.397  58.825 295.964  1.633 × 10^{6}