Muons in curium (Cm)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
96 (Cm) [247.07035(3)] 13.510  939.0 0.20257 2.7579 0.2484 3.5160 6.3097  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 3.635  3.635  1.614 × 10^{0}
14.0 MeV 5.616 × 10^{1} 2.913  2.913  2.854 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.330  2.330  5.180 × 10^{0}
30.0 MeV 8.509 × 10^{1} 1.847  1.847  1.006 × 10^{1}
40.0 MeV 1.003 × 10^{2} 1.598  1.598  1.591 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.232  1.232  4.525 × 10^{1}
100. MeV 1.764 × 10^{2} 1.167  1.167  6.197 × 10^{1}
140. MeV 2.218 × 10^{2} 1.107  1.108  9.731 × 10^{1}
200. MeV 2.868 × 10^{2} 1.083  1.083  1.523 × 10^{2}
222. MeV 3.104 × 10^{2} 1.082  0.000  1.082 Minimum ionization
300. MeV 3.917 × 10^{2} 1.090  0.000  0.000  1.090  2.445 × 10^{2}
400. MeV 4.945 × 10^{2} 1.111  0.000  0.000  1.112  3.353 × 10^{2}
800. MeV 8.995 × 10^{2} 1.196  0.001  0.000  1.198  6.813 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.229  0.002  0.000  1.231  8.459 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.281  0.003  0.000  1.285  1.164 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.338  0.004  0.001  0.001  1.344  1.620 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.401  0.008  0.003  0.001  1.414  2.344 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.445  0.011  0.006  0.002  1.465  3.038 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.544  0.028  0.023  0.003  1.599  5.641 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.574  0.038  0.033  0.004  1.649  6.872 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.617  0.058  0.055  0.005  1.735  9.234 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.659  0.090  0.091  0.007  1.847  1.258 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.704  0.147  0.161  0.011  2.023  1.775 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.733  0.207  0.238  0.014  2.194  2.250 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.798  0.469  0.580  0.027  2.876  3.838 × 10^{4}
100. GeV 1.001 × 10^{5} 1.818  0.608  0.765  0.034  3.226  4.494 × 10^{4}
126. GeV 1.258 × 10^{5} 1.837  0.789  1.006  0.042  3.677 Muon critical energy
140. GeV 1.401 × 10^{5} 1.846  0.892  1.145  0.047  3.933  5.616 × 10^{4}
200. GeV 2.001 × 10^{5} 1.876  1.337  1.748  0.067  5.030  6.962 × 10^{4}
300. GeV 3.001 × 10^{5} 1.908  2.095  2.755  0.101  6.860  8.659 × 10^{4}
400. GeV 4.001 × 10^{5} 1.931  2.879  3.798  0.134  8.744  9.948 × 10^{4}
800. GeV 8.001 × 10^{5} 1.987  6.110  8.075  0.271  16.444  1.323 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.005  7.768  10.262  0.341  20.378  1.432 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.032  11.089  14.624  0.483  28.229  1.598 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.062  16.164  21.280  0.698  40.206  1.776 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.096  24.631  32.338  1.067  60.133  1.978 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.120  33.205  43.512  1.441  80.281  2.121 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.181  67.749  88.424  2.991 161.346  2.466 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.200  85.145 110.996  3.786 202.130  2.576 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.231 119.842 156.037  5.417 283.528  2.742 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.263 172.170 223.882  7.914 406.231  2.918 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.301 259.370 336.752  12.227 610.652  3.118 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.328 346.882 449.882  16.639 815.733  3.259 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.395 696.903 902.706  35.048 1637.054  3.598 × 10^{5}
100. TeV 1.000 × 10^{8} 2.417 872.020 1129.320  44.550 2048.309  3.707 × 10^{5}