Muons in cortical bone (ICRP)

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.52130 & 1.850 & 106.4 & 0.06198 & 3.5919 & 0.1161 & 3.0919 & 3.6488 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.142  7.142  7.765 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.581  5.581  1.417 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.366  4.366  2.646 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.393  3.393  5.281 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.900  2.901  8.489 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.179  2.179  2.489 × 10^{1}
100. MeV 1.764 × 10^{2} 2.044  2.044  3.440 × 10^{1}
140. MeV 2.218 × 10^{2} 1.907  1.907  5.475 × 10^{1}
200. MeV 2.868 × 10^{2} 1.830  1.830  8.700 × 10^{1}
300. MeV 3.917 × 10^{2} 1.803  0.000  1.803  1.422 × 10^{2}
303. MeV 3.950 × 10^{2} 1.803  0.000  1.803 Minimum ionization
400. MeV 4.945 × 10^{2} 1.812  0.000  1.812  1.976 × 10^{2}
800. MeV 8.995 × 10^{2} 1.888  0.000  0.000  1.889  4.138 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.922  0.000  0.000  1.923  5.187 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.976  0.000  0.000  0.001  1.978  7.237 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.036  0.001  0.000  0.001  2.039  1.022 × 10^{3}
3.00 GeV 3.104 × 10^{3} 2.105  0.001  0.001  0.001  2.108  1.504 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.152  0.002  0.002  0.002  2.158  1.973 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.260  0.005  0.005  0.004  2.274  3.773 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.293  0.007  0.007  0.005  2.311  4.645 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.340  0.010  0.011  0.006  2.368  6.354 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.388  0.016  0.018  0.009  2.431  8.853 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.439  0.026  0.031  0.013  2.510  1.290 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.474  0.036  0.046  0.017  2.574  1.683 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.553  0.082  0.111  0.033  2.780  3.176 × 10^{4}
100. GeV 1.001 × 10^{5} 2.578  0.106  0.146  0.041  2.872  3.884 × 10^{4}
140. GeV 1.401 × 10^{5} 2.614  0.157  0.219  0.058  3.048  5.235 × 10^{4}
200. GeV 2.001 × 10^{5} 2.652  0.236  0.335  0.082  3.305  7.125 × 10^{4}
300. GeV 3.001 × 10^{5} 2.696  0.371  0.530  0.123  3.720  9.975 × 10^{4}
400. GeV 4.001 × 10^{5} 2.726  0.511  0.734  0.163  4.135  1.252 × 10^{5}
749. GeV 7.492 × 10^{5} 2.794  1.018  1.467  0.309  5.588 Muon critical energy
800. GeV 8.001 × 10^{5} 2.801  1.094  1.576  0.330  5.801  2.065 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.825  1.394  2.009  0.415  6.644  2.387 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.862  1.999  2.873  0.588  8.322  2.924 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.902  2.926  4.195  0.851  10.875  3.553 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.947  4.479  6.394  1.304  15.125  4.330 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.980  6.056  8.622  1.765  19.423  4.912 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.061  12.435  17.589  3.680  36.766  6.384 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.088  15.657  22.103  4.667  45.515  6.872 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.128  22.089  31.100  6.698  63.016  7.616 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.172  31.812  44.665  9.817  89.467  8.411 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.223  47.990  67.238  15.228 133.678  9.319 × 10^{5}
40.0 TeV 4.000 × 10^{7} 3.259  64.243  89.878  20.778 178.159  9.965 × 10^{5}
80.0 TeV 8.000 × 10^{7} 3.349 129.413 180.511  44.052 357.325  1.152 × 10^{6}
100. TeV 1.000 × 10^{8} 3.378 162.080 225.877  56.108 447.445  1.202 × 10^{6}