Muons in copper (Cu)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
29 (Cu) 63.546(3)  8.960  322.0 0.14339 2.9044 −0.0254 3.2792 4.4190  0.08
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 5.283  5.283  1.069 × 10^{0}
14.0 MeV 5.616 × 10^{1} 4.160  4.160  1.930 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.277  3.277  3.573 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.562  2.562  7.071 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.198  2.198  1.131 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.659  1.659  3.291 × 10^{1}
100. MeV 1.764 × 10^{2} 1.561  1.561  4.537 × 10^{1}
140. MeV 2.218 × 10^{2} 1.464  1.465  7.195 × 10^{1}
200. MeV 2.868 × 10^{2} 1.414  1.414  1.138 × 10^{2}
267. MeV 3.577 × 10^{2} 1.403  0.000  1.403 Minimum ionization
300. MeV 3.917 × 10^{2} 1.404  0.000  1.404  1.849 × 10^{2}
400. MeV 4.945 × 10^{2} 1.419  0.000  0.000  1.419  2.558 × 10^{2}
800. MeV 8.995 × 10^{2} 1.499  0.000  0.000  1.500  5.298 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.532  0.001  0.000  1.533  6.617 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.585  0.001  0.000  0.001  1.587  9.179 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.643  0.002  0.001  0.001  1.647  1.289 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.709  0.003  0.002  0.001  1.716  1.882 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.755  0.005  0.004  0.002  1.765  2.457 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.860  0.011  0.011  0.003  1.886  4.641 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.891  0.015  0.016  0.004  1.926  5.690 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.936  0.023  0.025  0.006  1.991  7.731 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.981  0.035  0.041  0.008  2.067  1.069 × 10^{4}
30.0 GeV 3.011 × 10^{4} 2.029  0.058  0.072  0.012  2.172  1.540 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.061  0.082  0.105  0.016  2.265  1.991 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.133  0.185  0.252  0.031  2.602  3.636 × 10^{4}
100. GeV 1.001 × 10^{5} 2.155  0.240  0.332  0.038  2.765  4.381 × 10^{4}
140. GeV 1.401 × 10^{5} 2.187  0.352  0.495  0.053  3.088  5.750 × 10^{4}
200. GeV 2.001 × 10^{5} 2.221  0.527  0.755  0.075  3.579  7.553 × 10^{4}
300. GeV 3.001 × 10^{5} 2.259  0.828  1.189  0.113  4.389  1.007 × 10^{5}
317. GeV 3.170 × 10^{5} 2.264  0.880  1.264  0.119  4.528 Muon critical energy
400. GeV 4.001 × 10^{5} 2.285  1.139  1.640  0.151  5.215  1.216 × 10^{5}
800. GeV 8.001 × 10^{5} 2.351  2.425  3.491  0.304  8.571  1.809 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.372  3.087  4.439  0.382  10.280  2.021 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.404  4.414  6.331  0.542  13.691  2.357 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.439  6.446  9.220  0.784  18.890  2.729 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.479  9.842  14.023  1.199  27.544  3.165 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.508  13.286  18.879  1.621  36.295  3.480 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.579  27.184  38.410  3.372  71.545  4.251 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.602  34.193  48.231  4.272  89.299  4.500 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.637  48.174  67.823  6.121 124.756  4.878 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.676  69.280  97.344  8.956 178.257  5.278 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.720 104.417 146.463  13.860 267.461  5.733 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.752 139.692 195.708  18.883 357.035  6.055 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.831 281.045 392.831  39.878 716.586  6.831 × 10^{5}
100. TeV 1.000 × 10^{8} 2.856 351.860 491.490  50.730 896.937  7.080 × 10^{5}