Muons in compact bone (ICRU)

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.53010 & 1.850 & 91.9 & 0.05822 & 3.6419 & 0.0944 & 3.0201 & 3.3390 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.406  7.406  7.477 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.783  5.783  1.365 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.521  4.521  2.552 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.511  3.511  5.097 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.000  3.000  8.199 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.247  2.247  2.408 × 10^{1}
100. MeV 1.764 × 10^{2} 2.106  2.106  3.330 × 10^{1}
140. MeV 2.218 × 10^{2} 1.962  1.962  5.307 × 10^{1}
200. MeV 2.868 × 10^{2} 1.880  1.880  8.444 × 10^{1}
300. MeV 3.917 × 10^{2} 1.849  0.000  1.850  1.382 × 10^{2}
314. MeV 4.065 × 10^{2} 1.849  0.000  1.849 Minimum ionization
400. MeV 4.945 × 10^{2} 1.856  0.000  1.857  1.922 × 10^{2}
800. MeV 8.995 × 10^{2} 1.930  0.000  0.000  1.930  4.036 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.963  0.000  0.000  1.964  5.063 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.017  0.000  0.000  0.001  2.018  7.071 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.076  0.001  0.000  0.001  2.078  9.998 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.144  0.001  0.001  0.001  2.148  1.473 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.191  0.002  0.001  0.002  2.196  1.933 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.299  0.004  0.004  0.004  2.312  3.702 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.332  0.006  0.006  0.005  2.349  4.560 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.380  0.009  0.010  0.006  2.405  6.242 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.428  0.014  0.016  0.009  2.467  8.704 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.480  0.023  0.028  0.013  2.544  1.269 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.515  0.032  0.041  0.017  2.605  1.658 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.595  0.073  0.099  0.034  2.801  3.136 × 10^{4}
100. GeV 1.001 × 10^{5} 2.620  0.095  0.130  0.042  2.887  3.839 × 10^{4}
140. GeV 1.401 × 10^{5} 2.657  0.140  0.195  0.058  3.050  5.187 × 10^{4}
200. GeV 2.001 × 10^{5} 2.696  0.210  0.298  0.083  3.286  7.081 × 10^{4}
300. GeV 3.001 × 10^{5} 2.740  0.331  0.472  0.124  3.667  9.960 × 10^{4}
400. GeV 4.001 × 10^{5} 2.771  0.456  0.654  0.165  4.046  1.256 × 10^{5}
800. GeV 8.001 × 10^{5} 2.847  0.977  1.407  0.333  5.564  2.095 × 10^{5}
837. GeV 8.367 × 10^{5} 2.852  1.026  1.477  0.349  5.704 Muon critical energy
1.00 TeV 1.000 × 10^{6} 2.871  1.246  1.795  0.418  6.331  2.432 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.909  1.787  2.568  0.593  7.857  2.998 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.949  2.617  3.751  0.859  10.177  3.667 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.996  4.007  5.720  1.316  14.040  4.501 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.029  5.421  7.716  1.781  17.947  5.129 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.112  11.138  15.749  3.716  33.714  6.729 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.139  14.027  19.793  4.712  41.671  7.262 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.180  19.794  27.854  6.764  57.592  8.075 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.224  28.514  40.008  9.916  81.663  8.946 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.276  43.026  60.233  15.385 121.920  9.941 × 10^{5}
40.0 TeV 4.000 × 10^{7} 3.313  57.608  80.519  20.997 162.437  1.065 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.404 116.078 161.730  44.538 325.750  1.235 × 10^{6}
100. TeV 1.000 × 10^{8} 3.434 145.387 202.381  56.736 407.939  1.290 × 10^{6}