Muons in cobalt (Co)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
27 (Co) 58.933194(4) 8.900  297.0 0.14474 2.9502 −0.0187 3.1790 4.2601  0.12
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 5.372  5.372  1.049 × 10^{0}
14.0 MeV 5.616 × 10^{1} 4.226  4.226  1.897 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.325  3.325  3.515 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.597  2.597  6.964 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.225  2.225  1.115 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.679  1.679  3.249 × 10^{1}
100. MeV 1.764 × 10^{2} 1.580  1.581  4.479 × 10^{1}
140. MeV 2.218 × 10^{2} 1.483  1.483  7.104 × 10^{1}
200. MeV 2.868 × 10^{2} 1.431  1.431  1.124 × 10^{2}
270. MeV 3.602 × 10^{2} 1.419  0.000  1.420 Minimum ionization
300. MeV 3.917 × 10^{2} 1.421  0.000  1.421  1.827 × 10^{2}
400. MeV 4.945 × 10^{2} 1.435  0.000  0.000  1.435  2.528 × 10^{2}
800. MeV 8.995 × 10^{2} 1.514  0.000  0.000  1.515  5.238 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.547  0.001  0.000  1.548  6.544 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.600  0.001  0.000  0.001  1.602  9.081 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.658  0.002  0.001  0.001  1.661  1.275 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.723  0.003  0.002  0.001  1.730  1.865 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.769  0.004  0.003  0.002  1.778  2.434 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.872  0.011  0.011  0.003  1.897  4.604 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.903  0.014  0.015  0.004  1.936  5.648 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.947  0.021  0.024  0.006  1.999  7.679 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.992  0.033  0.039  0.008  2.073  1.062 × 10^{4}
30.0 GeV 3.011 × 10^{4} 2.039  0.055  0.068  0.012  2.174  1.533 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.071  0.077  0.099  0.016  2.263  1.984 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.142  0.174  0.237  0.031  2.585  3.635 × 10^{4}
100. GeV 1.001 × 10^{5} 2.164  0.225  0.312  0.038  2.740  4.386 × 10^{4}
140. GeV 1.401 × 10^{5} 2.196  0.331  0.466  0.053  3.047  5.770 × 10^{4}
200. GeV 2.001 × 10^{5} 2.230  0.496  0.710  0.076  3.513  7.602 × 10^{4}
300. GeV 3.001 × 10^{5} 2.268  0.779  1.120  0.114  4.281  1.018 × 10^{5}
336. GeV 3.356 × 10^{5} 2.278  0.882  1.269  0.127  4.557 Muon critical energy
400. GeV 4.001 × 10^{5} 2.295  1.072  1.544  0.151  5.063  1.232 × 10^{5}
800. GeV 8.001 × 10^{5} 2.360  2.283  3.289  0.306  8.239  1.846 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.382  2.906  4.183  0.384  9.855  2.068 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.414  4.156  5.967  0.545  13.082  2.419 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.449  6.070  8.691  0.788  17.999  2.808 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.489  9.269  13.220  1.206  26.185  3.267 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.518  12.514  17.800  1.630  34.462  3.598 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.589  25.609  36.218  3.392  67.810  4.410 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.612  32.214  45.481  4.298  84.606  4.674 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.648  45.388  63.959  6.158 118.154  5.072 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.686  65.278  91.802  9.010 168.777  5.495 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.731  98.391 138.129  13.946 253.198  5.976 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.763 131.636 184.575  19.003 337.979  6.316 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.842 264.858 370.503  40.143 678.346  7.135 × 10^{5}
100. TeV 1.000 × 10^{8} 2.868 331.600 463.560  51.070 849.099  7.398 × 10^{5}