Muons in chromium (Cr)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
24 (Cr) 51.9961(6)  7.180  257.0 0.15419 2.9896 0.0340 3.0451 4.1781  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 5.542  5.542  1.014 × 10^{0}
14.0 MeV 5.616 × 10^{1} 4.354  4.354  1.836 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.422  3.422  3.408 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.670  2.670  6.761 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.287  2.287  1.083 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.725  1.725  3.160 × 10^{1}
100. MeV 1.764 × 10^{2} 1.623  1.623  4.358 × 10^{1}
140. MeV 2.218 × 10^{2} 1.522  1.522  6.914 × 10^{1}
200. MeV 2.868 × 10^{2} 1.469  1.469  1.094 × 10^{2}
273. MeV 3.633 × 10^{2} 1.456  0.000  1.456 Minimum ionization
300. MeV 3.917 × 10^{2} 1.457  0.000  1.457  1.779 × 10^{2}
400. MeV 4.945 × 10^{2} 1.471  0.000  0.000  1.472  2.463 × 10^{2}
800. MeV 8.995 × 10^{2} 1.550  0.000  0.000  1.551  5.109 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.583  0.001  0.000  1.584  6.385 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.636  0.001  0.000  0.001  1.638  8.866 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.693  0.002  0.001  0.001  1.697  1.246 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.758  0.003  0.002  0.001  1.764  1.823 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.803  0.004  0.003  0.002  1.812  2.382 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.905  0.010  0.010  0.003  1.928  4.514 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.936  0.013  0.013  0.004  1.967  5.541 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.980  0.019  0.022  0.006  2.027  7.543 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.024  0.030  0.035  0.008  2.098  1.045 × 10^{4}
30.0 GeV 3.011 × 10^{4} 2.071  0.049  0.061  0.012  2.194  1.511 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.102  0.070  0.090  0.016  2.278  1.958 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.173  0.157  0.215  0.031  2.577  3.606 × 10^{4}
100. GeV 1.001 × 10^{5} 2.195  0.204  0.282  0.039  2.720  4.361 × 10^{4}
140. GeV 1.401 × 10^{5} 2.227  0.300  0.422  0.054  3.003  5.760 × 10^{4}
200. GeV 2.001 × 10^{5} 2.261  0.449  0.644  0.076  3.431  7.628 × 10^{4}
300. GeV 3.001 × 10^{5} 2.299  0.706  1.015  0.115  4.136  1.028 × 10^{5}
370. GeV 3.706 × 10^{5} 2.319  0.892  1.286  0.141  4.639 Muon critical energy
400. GeV 4.001 × 10^{5} 2.326  0.971  1.401  0.153  4.852  1.251 × 10^{5}
800. GeV 8.001 × 10^{5} 2.392  2.069  2.985  0.309  7.756  1.897 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.414  2.634  3.797  0.388  9.234  2.133 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.447  3.768  5.417  0.550  12.183  2.510 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.482  5.505  7.893  0.795  16.677  2.929 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.522  8.409  12.009  1.217  24.158  3.425 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.551  11.355  16.171  1.646  31.723  3.785 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.623  23.245  32.913  3.425  62.207  4.669 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.646  29.243  41.333  4.340  77.563  4.956 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.682  41.207  58.130  6.219 108.240  5.391 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.721  59.272  83.442  9.102 154.538  5.852 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.766  89.347 125.555  14.091 231.760  6.377 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.798 119.546 167.777  19.203 309.324  6.749 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.878 240.561 336.801  40.578 620.817  7.644 × 10^{5}
100. TeV 1.000 × 10^{8} 2.904 301.190 421.400  51.630 777.125  7.931 × 10^{5}