Muons in chloroform (CHCl_{3})

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.48585 & 1.483 & 156.0 & 0.16959 & 3.0627 & 0.1786 & 2.9581 & 4.7055 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 6.311  6.311  8.824 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 4.942  4.942  1.606 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.874  3.874  2.993 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.017  3.017  5.958 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.583  2.583  9.564 × 10^{0}
80.0 MeV 1.527 × 10^{2} 1.951  1.951  2.794 × 10^{1}
100. MeV 1.764 × 10^{2} 1.836  1.837  3.854 × 10^{1}
140. MeV 2.218 × 10^{2} 1.722  1.722  6.113 × 10^{1}
200. MeV 2.868 × 10^{2} 1.661  1.661  9.673 × 10^{1}
277. MeV 3.683 × 10^{2} 1.645  0.000  1.646 Minimum ionization
300. MeV 3.917 × 10^{2} 1.646  0.000  1.646  1.574 × 10^{2}
400. MeV 4.945 × 10^{2} 1.660  0.000  0.000  1.661  2.179 × 10^{2}
800. MeV 8.995 × 10^{2} 1.745  0.000  0.000  1.745  4.527 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.780  0.000  0.000  1.781  5.661 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.836  0.001  0.000  0.001  1.838  7.871 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.898  0.001  0.001  0.001  1.900  1.108 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.967  0.002  0.001  0.001  1.971  1.624 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.014  0.003  0.002  0.002  2.021  2.124 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.122  0.007  0.007  0.004  2.139  4.041 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.154  0.009  0.009  0.004  2.177  4.968 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.200  0.014  0.015  0.006  2.235  6.780 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.246  0.021  0.025  0.009  2.301  9.424 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.295  0.035  0.043  0.013  2.386  1.369 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.327  0.050  0.063  0.017  2.457  1.782 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.401  0.112  0.152  0.032  2.699  3.332 × 10^{4}
100. GeV 1.001 × 10^{5} 2.424  0.145  0.201  0.040  2.810  4.059 × 10^{4}
140. GeV 1.401 × 10^{5} 2.458  0.214  0.300  0.056  3.028  5.429 × 10^{4}
200. GeV 2.001 × 10^{5} 2.494  0.321  0.459  0.079  3.353  7.311 × 10^{4}
300. GeV 3.001 × 10^{5} 2.534  0.504  0.725  0.119  3.882  1.008 × 10^{5}
400. GeV 4.001 × 10^{5} 2.563  0.695  1.001  0.158  4.417  1.249 × 10^{5}
543. GeV 5.430 × 10^{5} 2.593  0.973  1.405  0.215  5.187 Muon critical energy
800. GeV 8.001 × 10^{5} 2.632  1.483  2.140  0.320  6.574  1.987 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.655  1.888  2.724  0.401  7.669  2.268 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.689  2.704  3.891  0.569  9.854  2.728 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.726  3.954  5.676  0.824  13.180  3.252 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.769  6.045  8.642  1.261  18.718  3.886 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.799  8.168  11.645  1.706  24.318  4.353 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.875  16.744  23.726  3.554  46.899  5.517 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.900  21.072  29.804  4.505  58.282  5.899 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.937  29.715  41.922  6.461  81.035  6.479 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.978  42.773  60.185  9.462 115.398  7.096 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.025  64.487  90.587  14.662 172.761  7.800 × 10^{5}
40.0 TeV 4.000 × 10^{7} 3.059  86.292 121.076  19.993 230.420  8.299 × 10^{5}
80.0 TeV 8.000 × 10^{7} 3.143 173.711 243.121  42.309 462.285  9.501 × 10^{5}
100. TeV 1.000 × 10^{8} 3.170 217.524 304.206  53.857 578.758  9.887 × 10^{5}