Muons in chlorobenzene C_{6}H_{5}Cl

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.51529 & 1.106 & 89.1 & 0.09856 & 3.3797 & 0.1714 & 2.9272 & 3.8201 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.229  7.229  7.658 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.644  5.644  1.399 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.411  4.411  2.615 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.425  3.425  5.224 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.926  2.926  8.403 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.200  2.200  2.467 × 10^{1}
100. MeV 1.764 × 10^{2} 2.065  2.065  3.408 × 10^{1}
140. MeV 2.218 × 10^{2} 1.926  1.926  5.423 × 10^{1}
200. MeV 2.868 × 10^{2} 1.848  1.848  8.615 × 10^{1}
300. MeV 3.917 × 10^{2} 1.821  0.000  1.821  1.408 × 10^{2}
303. MeV 3.950 × 10^{2} 1.821  0.000  1.821 Minimum ionization
400. MeV 4.945 × 10^{2} 1.830  0.000  1.830  1.956 × 10^{2}
800. MeV 8.995 × 10^{2} 1.906  0.000  0.000  1.906  4.098 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.940  0.000  0.000  1.940  5.138 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.994  0.000  0.000  0.001  1.995  7.169 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.054  0.001  0.000  0.001  2.056  1.013 × 10^{3}
3.00 GeV 3.104 × 10^{3} 2.122  0.001  0.001  0.001  2.126  1.491 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.169  0.002  0.001  0.002  2.174  1.956 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.276  0.004  0.004  0.004  2.289  3.743 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.309  0.006  0.006  0.005  2.325  4.610 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.356  0.009  0.009  0.006  2.380  6.309 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.403  0.014  0.016  0.009  2.441  8.796 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.453  0.022  0.027  0.013  2.516  1.283 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.487  0.031  0.040  0.017  2.576  1.675 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.565  0.071  0.096  0.034  2.767  3.171 × 10^{4}
100. GeV 1.001 × 10^{5} 2.590  0.093  0.127  0.042  2.851  3.883 × 10^{4}
140. GeV 1.401 × 10^{5} 2.626  0.136  0.190  0.058  3.011  5.248 × 10^{4}
200. GeV 2.001 × 10^{5} 2.663  0.205  0.291  0.082  3.242  7.168 × 10^{4}
300. GeV 3.001 × 10^{5} 2.706  0.323  0.462  0.124  3.615  1.009 × 10^{5}
400. GeV 4.001 × 10^{5} 2.737  0.445  0.639  0.165  3.986  1.272 × 10^{5}
800. GeV 8.001 × 10^{5} 2.810  0.953  1.374  0.333  5.471  2.125 × 10^{5}
843. GeV 8.432 × 10^{5} 2.816  1.010  1.455  0.351  5.632 Muon critical energy
1.00 TeV 1.000 × 10^{6} 2.834  1.216  1.753  0.418  6.221  2.468 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.871  1.744  2.508  0.593  7.716  3.044 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.910  2.554  3.665  0.858  9.987  3.726 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.955  3.910  5.588  1.315  13.769  4.575 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.988  5.289  7.538  1.779  17.594  5.216 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.068  10.867  15.385  3.712  33.033  6.849 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.094  13.686  19.336  4.708  40.825  7.393 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.134  19.313  27.210  6.758  56.416  8.223 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.177  27.821  39.083  9.907  79.988  9.112 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.227  41.976  58.841  15.372 119.417  1.013 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.263  56.201  78.661  20.979 159.103  1.085 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.352 113.219 158.002  44.496 319.069  1.259 × 10^{6}
100. TeV 1.000 × 10^{8} 3.381 141.796 197.716  56.683 399.576  1.315 × 10^{6}