Muons in cesium iodide (CsI)

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.41569 & 4.510 & 553.1 & 0.25381 & 2.6657 & 0.0395 & 3.3353 & 6.2807 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.423  4.423  1.283 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.495  3.495  2.310 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.763  2.763  4.262 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.171  2.171  8.399 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.869  1.869  1.339 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.432  1.432  3.859 × 10^{1}
100. MeV 1.764 × 10^{2} 1.355  1.355  5.298 × 10^{1}
140. MeV 2.218 × 10^{2} 1.281  1.281  8.347 × 10^{1}
200. MeV 2.868 × 10^{2} 1.247  1.247  1.311 × 10^{2}
237. MeV 3.260 × 10^{2} 1.243  1.243 Minimum ionization
300. MeV 3.917 × 10^{2} 1.248  0.000  0.000  1.249  2.114 × 10^{2}
400. MeV 4.945 × 10^{2} 1.269  0.000  0.000  1.269  2.909 × 10^{2}
800. MeV 8.995 × 10^{2} 1.356  0.001  0.000  1.357  5.953 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.391  0.001  0.000  1.392  7.407 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.446  0.002  0.000  0.001  1.449  1.022 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.505  0.003  0.001  0.001  1.511  1.427 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.573  0.005  0.003  0.001  1.582  2.073 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.619  0.007  0.006  0.002  1.634  2.694 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.724  0.018  0.017  0.003  1.763  5.042 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.755  0.024  0.024  0.004  1.808  6.161 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.800  0.037  0.040  0.005  1.883  8.328 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.845  0.057  0.065  0.008  1.975  1.144 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.892  0.093  0.113  0.011  2.110  1.633 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.923  0.131  0.165  0.015  2.235  2.094 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.991  0.297  0.397  0.029  2.715  3.714 × 10^{4}
100. GeV 1.001 × 10^{5} 2.012  0.384  0.522  0.036  2.955  4.420 × 10^{4}
140. GeV 1.401 × 10^{5} 2.042  0.564  0.779  0.050  3.436  5.675 × 10^{4}
197. GeV 1.976 × 10^{5} 2.071  0.833  1.168  0.070  4.144 Muon critical energy
200. GeV 2.001 × 10^{5} 2.073  0.845  1.186  0.071  4.176  7.257 × 10^{4}
300. GeV 3.001 × 10^{5} 2.107  1.326  1.866  0.107  5.406  9.357 × 10^{4}
400. GeV 4.001 × 10^{5} 2.132  1.822  2.571  0.142  6.668  1.102 × 10^{5}
800. GeV 8.001 × 10^{5} 2.191  3.873  5.460  0.287  11.812  1.547 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.210  4.926  6.938  0.361  14.436  1.700 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.240  7.037  9.886  0.511  19.676  1.936 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.271  10.267  14.386  0.739  27.665  2.192 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.308  15.659  21.863  1.131  40.961  2.488 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.334  21.122  29.419  1.528  54.405  2.699 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.399  43.151  59.794  3.174 108.520  3.209 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.420  54.252  75.063  4.019 135.755  3.374 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.452  76.393 105.529  5.754 190.130  3.622 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.487 109.800 151.423  8.414 272.126  3.884 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.527 165.415 227.780  13.007 408.730  4.182 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.556 221.230 304.316  17.708 545.812  4.393 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.628 444.823 610.679  37.330 1095.462  4.900 × 10^{5}
100. TeV 1.000 × 10^{8} 2.652 556.808 764.003  47.463 1370.926  5.063 × 10^{5}