Muons in cesium fluoride (CsF)

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.42132 & 4.115 & 440.7 & 0.22052 & 2.7280 & 0.0084 & 3.3374 & 5.9046 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.661  4.661  1.212 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.676  3.676  2.188 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.901  2.901  4.046 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.275  2.275  7.991 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.956  1.956  1.276 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.493  1.493  3.687 × 10^{1}
100. MeV 1.764 × 10^{2} 1.410  1.410  5.069 × 10^{1}
140. MeV 2.218 × 10^{2} 1.330  1.330  8.002 × 10^{1}
200. MeV 2.868 × 10^{2} 1.291  1.292  1.259 × 10^{2}
247. MeV 3.366 × 10^{2} 1.286  1.286 Minimum ionization
300. MeV 3.917 × 10^{2} 1.290  0.000  0.000  1.290  2.036 × 10^{2}
400. MeV 4.945 × 10^{2} 1.308  0.000  0.000  1.309  2.806 × 10^{2}
800. MeV 8.995 × 10^{2} 1.393  0.001  0.000  1.395  5.763 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.428  0.001  0.000  1.429  7.179 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.482  0.002  0.000  0.001  1.484  9.923 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.541  0.003  0.001  0.001  1.545  1.388 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.607  0.005  0.003  0.001  1.616  2.020 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.653  0.007  0.005  0.002  1.667  2.629 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.757  0.016  0.016  0.003  1.793  4.933 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.788  0.022  0.022  0.004  1.837  6.035 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.833  0.033  0.036  0.006  1.909  8.169 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.877  0.052  0.059  0.008  1.997  1.124 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.924  0.085  0.103  0.011  2.124  1.609 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.955  0.120  0.151  0.015  2.242  2.067 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.024  0.271  0.362  0.029  2.688  3.694 × 10^{4}
100. GeV 1.001 × 10^{5} 2.044  0.351  0.476  0.037  2.909  4.409 × 10^{4}
140. GeV 1.401 × 10^{5} 2.075  0.515  0.711  0.051  3.353  5.689 × 10^{4}
200. GeV 2.001 × 10^{5} 2.106  0.773  1.083  0.072  4.035  7.318 × 10^{4}
217. GeV 2.173 × 10^{5} 2.113  0.847  1.188  0.078  4.227 Muon critical energy
300. GeV 3.001 × 10^{5} 2.141  1.212  1.705  0.108  5.167  9.504 × 10^{4}
400. GeV 4.001 × 10^{5} 2.165  1.666  2.349  0.144  6.326  1.125 × 10^{5}
800. GeV 8.001 × 10^{5} 2.226  3.541  4.991  0.292  11.051  1.598 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.245  4.505  6.343  0.367  13.461  1.761 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.275  6.436  9.040  0.520  18.272  2.016 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.307  9.391  13.156  0.752  25.607  2.292 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.344  14.324  19.996  1.150  37.815  2.611 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.371  19.323  26.909  1.554  50.158  2.840 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.436  39.480  54.698  3.231  99.847  3.394 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.458  49.639  68.668  4.092 124.857  3.573 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.490  69.901  96.541  5.860 174.794  3.843 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.526 100.475 138.530  8.571 250.103  4.128 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.567 151.373 208.389  13.255 375.585  4.452 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.596 202.455 278.414  18.051 501.517  4.682 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.669 407.093 558.720  38.084 1006.567  5.234 × 10^{5}
100. TeV 1.000 × 10^{8} 2.693 509.587 699.006  48.433 1259.720  5.411 × 10^{5}