Muons in cerium (Ce)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
58 (Ce) 140.116(1)  6.770  523.0 0.18885 2.8592 0.2676 3.3395 5.7669  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.405  4.405  1.296 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.488  3.488  2.327 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.761  2.761  4.281 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.170  2.170  8.421 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.868  1.868  1.342 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.425  1.425  3.867 × 10^{1}
100. MeV 1.764 × 10^{2} 1.347  1.347  5.314 × 10^{1}
140. MeV 2.218 × 10^{2} 1.272  1.272  8.385 × 10^{1}
200. MeV 2.868 × 10^{2} 1.238  1.238  1.318 × 10^{2}
239. MeV 3.285 × 10^{2} 1.234  1.234 Minimum ionization
300. MeV 3.917 × 10^{2} 1.239  0.000  0.000  1.239  2.127 × 10^{2}
400. MeV 4.945 × 10^{2} 1.259  0.000  0.000  1.259  2.928 × 10^{2}
800. MeV 8.995 × 10^{2} 1.344  0.001  0.000  1.345  5.998 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.378  0.001  0.000  1.379  7.466 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.431  0.002  0.000  0.001  1.434  1.031 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.489  0.003  0.001  0.001  1.494  1.440 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.554  0.005  0.003  0.001  1.564  2.093 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.598  0.008  0.006  0.002  1.614  2.722 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.700  0.019  0.018  0.003  1.741  5.099 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.730  0.025  0.026  0.004  1.785  6.233 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.773  0.039  0.042  0.005  1.860  8.427 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.816  0.060  0.068  0.008  1.953  1.157 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.861  0.099  0.119  0.011  2.091  1.652 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.892  0.139  0.175  0.015  2.221  2.116 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.958  0.315  0.420  0.029  2.723  3.739 × 10^{4}
100. GeV 1.001 × 10^{5} 1.978  0.408  0.552  0.036  2.975  4.441 × 10^{4}
140. GeV 1.401 × 10^{5} 2.008  0.599  0.823  0.050  3.481  5.683 × 10^{4}
185. GeV 1.851 × 10^{5} 2.032  0.822  1.144  0.065  4.065 Muon critical energy
200. GeV 2.001 × 10^{5} 2.038  0.898  1.254  0.071  4.262  7.239 × 10^{4}
300. GeV 3.001 × 10^{5} 2.073  1.409  1.973  0.106  5.561  9.289 × 10^{4}
400. GeV 4.001 × 10^{5} 2.097  1.936  2.717  0.141  6.893  1.090 × 10^{5}
800. GeV 8.001 × 10^{5} 2.156  4.114  5.771  0.285  12.329  1.518 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.176  5.233  7.333  0.359  15.102  1.665 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.205  7.475  10.449  0.508  20.639  1.890 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.236  10.905  15.204  0.735  29.082  2.134 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.273  16.630  23.106  1.123  43.133  2.415 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.299  22.431  31.090  1.518  57.339  2.615 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.363  45.816  63.187  3.153 114.520  3.099 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.384  57.599  79.320  3.992 143.297  3.255 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.416  81.101 111.511  5.715 200.745  3.490 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.451 116.560 160.002  8.354 287.368  3.738 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.491 175.591 240.683  12.915 431.681  4.020 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.520 234.833 321.553  17.582 576.490  4.220 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.591 472.146 645.259  37.062 1157.061  4.700 × 10^{5}
100. TeV 1.000 × 10^{8} 2.615 591.000 807.260  47.120 1447.996  4.854 × 10^{5}