Muons in ceric sulfate dosimeter solution

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.55279 & 1.030 & 76.7 & 0.07666 & 3.5607 & 0.2363 & 2.8769 & 3.5212 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.909  7.909  6.989 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 6.170  6.170  1.278 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.819  4.819  2.391 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.739  3.739  4.779 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.193  3.193  7.693 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.398  2.398  2.261 × 10^{1}
100. MeV 1.764 × 10^{2} 2.255  2.255  3.123 × 10^{1}
140. MeV 2.218 × 10^{2} 2.102  2.102  4.968 × 10^{1}
200. MeV 2.868 × 10^{2} 2.013  2.014  7.896 × 10^{1}
300. MeV 3.917 × 10^{2} 1.980  0.000  1.980  1.292 × 10^{2}
317. MeV 4.096 × 10^{2} 1.979  0.000  1.979 Minimum ionization
400. MeV 4.945 × 10^{2} 1.986  0.000  1.986  1.797 × 10^{2}
800. MeV 8.995 × 10^{2} 2.062  0.000  0.000  2.062  3.774 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.096  0.000  0.000  2.097  4.735 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.152  0.000  0.001  2.153  6.616 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.214  0.001  0.000  0.001  2.216  9.361 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.284  0.001  0.001  0.001  2.288  1.380 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.333  0.002  0.001  0.002  2.338  1.812 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.445  0.004  0.004  0.004  2.457  3.476 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.479  0.005  0.005  0.005  2.494  4.283 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.529  0.008  0.008  0.007  2.551  5.868 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.578  0.012  0.013  0.009  2.613  8.190 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.632  0.019  0.023  0.013  2.688  1.196 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.669  0.027  0.034  0.018  2.748  1.564 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.752  0.062  0.083  0.034  2.931  2.971 × 10^{4}
100. GeV 1.001 × 10^{5} 2.778  0.080  0.110  0.042  3.010  3.644 × 10^{4}
140. GeV 1.401 × 10^{5} 2.817  0.118  0.165  0.059  3.159  4.941 × 10^{4}
200. GeV 2.001 × 10^{5} 2.857  0.178  0.252  0.083  3.371  6.779 × 10^{4}
300. GeV 3.001 × 10^{5} 2.903  0.281  0.400  0.125  3.710  9.605 × 10^{4}
400. GeV 4.001 × 10^{5} 2.936  0.388  0.555  0.167  4.045  1.219 × 10^{5}
800. GeV 8.001 × 10^{5} 3.015  0.832  1.197  0.337  5.381  2.073 × 10^{5}
1.00 TeV 1.000 × 10^{6} 3.041  1.062  1.529  0.423  6.055  2.423 × 10^{5}
1.01 TeV 1.009 × 10^{6} 3.042  1.072  1.543  0.427  6.083 Muon critical energy
1.40 TeV 1.400 × 10^{6} 3.080  1.525  2.190  0.600  7.394  3.020 × 10^{5}
2.00 TeV 2.000 × 10^{6} 3.122  2.235  3.202  0.868  9.427  3.737 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.170  3.426  4.886  1.330  12.814  4.644 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.205  4.638  6.594  1.800  16.238  5.336 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.291  9.543  13.473  3.758  30.066  7.118 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.319  12.024  16.937  4.766  37.047  7.716 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.362  16.975  23.840  6.844  51.021  8.633 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.408  24.464  34.250  10.036  72.159  9.617 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.462  36.935  51.573  15.576 107.546  1.074 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.501  49.471  68.950  21.262 143.185  1.155 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.596  99.760 138.518  45.123 286.998  1.348 × 10^{6}
100. TeV 1.000 × 10^{8} 3.627 124.977 173.343  57.492 359.440  1.410 × 10^{6}