Muons in cellulose nitrate [(C_{12}H_{14}O_{4}(ONO_{2})_{6})_{n}]

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.51424 & 1.490 & 87.0 & 0.11813 & 3.3237 & 0.1897 & 2.7253 & 3.4762 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.237  7.237  7.647 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.649  5.649  1.397 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.415  4.415  2.612 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.428  3.428  5.219 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.928  2.928  8.396 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.201  2.201  2.465 × 10^{1}
100. MeV 1.764 × 10^{2} 2.066  2.067  3.405 × 10^{1}
140. MeV 2.218 × 10^{2} 1.926  1.926  5.420 × 10^{1}
200. MeV 2.868 × 10^{2} 1.845  1.845  8.615 × 10^{1}
300. MeV 3.917 × 10^{2} 1.815  0.000  1.816  1.410 × 10^{2}
314. MeV 4.065 × 10^{2} 1.815  0.000  1.815 Minimum ionization
400. MeV 4.945 × 10^{2} 1.822  0.000  1.822  1.960 × 10^{2}
800. MeV 8.995 × 10^{2} 1.894  0.000  0.000  1.894  4.113 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.926  0.000  0.000  1.927  5.160 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.979  0.000  0.001  1.980  7.206 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.037  0.001  0.000  0.001  2.038  1.019 × 10^{3}
3.00 GeV 3.104 × 10^{3} 2.102  0.001  0.001  0.001  2.105  1.501 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.148  0.001  0.001  0.002  2.152  1.971 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.252  0.004  0.003  0.004  2.263  3.777 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.284  0.005  0.005  0.005  2.298  4.654 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.329  0.007  0.008  0.007  2.351  6.374 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.376  0.011  0.013  0.009  2.409  8.894 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.425  0.018  0.022  0.013  2.479  1.298 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.459  0.026  0.033  0.018  2.535  1.697 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.537  0.059  0.079  0.034  2.709  3.221 × 10^{4}
100. GeV 1.001 × 10^{5} 2.561  0.076  0.104  0.042  2.784  3.949 × 10^{4}
140. GeV 1.401 × 10^{5} 2.597  0.112  0.156  0.059  2.924  5.351 × 10^{4}
200. GeV 2.001 × 10^{5} 2.635  0.169  0.239  0.083  3.126  7.334 × 10^{4}
300. GeV 3.001 × 10^{5} 2.677  0.267  0.380  0.125  3.449  1.038 × 10^{5}
400. GeV 4.001 × 10^{5} 2.708  0.368  0.527  0.166  3.769  1.315 × 10^{5}
800. GeV 8.001 × 10^{5} 2.781  0.790  1.137  0.335  5.044  2.229 × 10^{5}
974. GeV 9.745 × 10^{5} 2.802  0.979  1.412  0.410  5.605 Muon critical energy
1.00 TeV 1.000 × 10^{6} 2.805  1.008  1.453  0.421  5.687  2.603 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.841  1.446  2.081  0.598  6.966  3.237 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.881  2.120  3.043  0.865  8.909  3.997 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.926  3.249  4.644  1.326  12.145  4.955 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.958  4.397  6.267  1.794  15.417  5.684 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.038  9.045  12.806  3.745  28.634  7.559 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.064  11.395  16.099  4.750  35.308  8.186 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.104  16.084  22.660  6.819  48.668  9.148 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.147  23.176  32.556  9.998  68.878  1.018 × 10^{6}
30.0 TeV 3.000 × 10^{7} 3.197  34.984  49.023  15.515 102.720  1.136 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.233  46.854  65.542  21.177 136.807  1.220 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.322  94.446 131.677  44.931 274.376  1.423 × 10^{6}
100. TeV 1.000 × 10^{8} 3.351 118.305 164.783  57.241 343.680  1.488 × 10^{6}