Muons in cellulose acetate butyrate [(C_{15}H_{22}O_{8})_{n}]

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.53279 & 1.200 & 74.6 & 0.11444 & 3.3738 & 0.1794 & 2.6809 & 3.3497 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.650  7.650  7.224 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.967  5.967  1.321 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.660  4.660  2.472 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.615  3.615  4.942 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.087  3.087  7.955 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.318  2.318  2.339 × 10^{1}
100. MeV 1.764 × 10^{2} 2.174  2.174  3.232 × 10^{1}
140. MeV 2.218 × 10^{2} 2.024  2.024  5.148 × 10^{1}
200. MeV 2.868 × 10^{2} 1.938  1.938  8.189 × 10^{1}
300. MeV 3.917 × 10^{2} 1.905  0.000  1.905  1.341 × 10^{2}
318. MeV 4.105 × 10^{2} 1.904  0.000  1.905 Minimum ionization
400. MeV 4.945 × 10^{2} 1.911  0.000  1.911  1.865 × 10^{2}
800. MeV 8.995 × 10^{2} 1.983  0.000  0.000  1.983  3.921 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.016  0.000  0.000  2.017  4.920 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.069  0.000  0.001  2.071  6.877 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.128  0.001  0.000  0.001  2.130  9.731 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.196  0.001  0.001  0.001  2.199  1.435 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.242  0.001  0.001  0.002  2.247  1.884 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.349  0.003  0.003  0.004  2.360  3.616 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.382  0.004  0.004  0.005  2.395  4.457 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.429  0.007  0.007  0.007  2.449  6.108 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.476  0.010  0.012  0.009  2.508  8.527 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.528  0.017  0.020  0.014  2.579  1.246 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.563  0.024  0.030  0.018  2.634  1.629 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.643  0.054  0.073  0.034  2.805  3.098 × 10^{4}
100. GeV 1.001 × 10^{5} 2.668  0.071  0.096  0.042  2.878  3.802 × 10^{4}
140. GeV 1.401 × 10^{5} 2.705  0.104  0.145  0.059  3.013  5.160 × 10^{4}
200. GeV 2.001 × 10^{5} 2.744  0.157  0.222  0.084  3.207  7.089 × 10^{4}
300. GeV 3.001 × 10^{5} 2.789  0.248  0.352  0.126  3.514  1.007 × 10^{5}
400. GeV 4.001 × 10^{5} 2.820  0.342  0.489  0.167  3.818  1.280 × 10^{5}
800. GeV 8.001 × 10^{5} 2.896  0.734  1.057  0.338  5.025  2.190 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.921  0.937  1.350  0.425  5.633  2.566 × 10^{5}
1.07 TeV 1.075 × 10^{6} 2.929  1.013  1.459  0.458  5.859 Muon critical energy
1.40 TeV 1.400 × 10^{6} 2.959  1.346  1.935  0.602  6.841  3.209 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.999  1.973  2.831  0.872  8.676  3.986 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.046  3.026  4.322  1.337  11.731  4.974 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.080  4.097  5.835  1.809  14.821  5.731 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.162  8.436  11.928  3.776  27.302  7.690 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.189  10.630  14.997  4.790  33.607  8.349 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.231  15.009  21.113  6.878  46.231  9.359 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.276  21.634  30.337  10.086  65.334  1.045 × 10^{6}
30.0 TeV 3.000 × 10^{7} 3.327  32.666  45.685  15.657  97.334  1.169 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.364  43.757  61.082  21.374 129.578  1.258 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.456  88.226 122.726  45.372 259.780  1.472 × 10^{6}
100. TeV 1.000 × 10^{8} 3.487 110.517 153.585  57.813 325.402  1.540 × 10^{6}