Muons in cellulose [(C_{6}H_{10}O_{5})_{n}]

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.53040 & 1.420 & 77.6 & 0.11151 & 3.3810 & 0.1580 & 2.6778 & 3.2647 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.577  7.577  7.296 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.911  5.911  1.334 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.617  4.617  2.495 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.583  3.583  4.988 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.060  3.060  8.028 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.297  2.297  2.360 × 10^{1}
100. MeV 1.764 × 10^{2} 2.152  2.152  3.261 × 10^{1}
140. MeV 2.218 × 10^{2} 2.003  2.004  5.197 × 10^{1}
200. MeV 2.868 × 10^{2} 1.918  1.918  8.270 × 10^{1}
300. MeV 3.917 × 10^{2} 1.885  0.000  1.885  1.354 × 10^{2}
318. MeV 4.105 × 10^{2} 1.885  0.000  1.885 Minimum ionization
400. MeV 4.945 × 10^{2} 1.891  0.000  1.891  1.884 × 10^{2}
800. MeV 8.995 × 10^{2} 1.962  0.000  0.000  1.963  3.961 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.995  0.000  0.000  1.996  4.972 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.048  0.000  0.001  2.049  6.949 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.106  0.001  0.000  0.001  2.108  9.833 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.173  0.001  0.001  0.001  2.176  1.450 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.219  0.001  0.001  0.002  2.224  1.904 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.326  0.003  0.003  0.004  2.336  3.654 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.358  0.004  0.004  0.005  2.372  4.503 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.405  0.007  0.007  0.007  2.425  6.170 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.452  0.011  0.012  0.009  2.484  8.613 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.503  0.017  0.021  0.013  2.555  1.258 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.538  0.025  0.031  0.018  2.611  1.645 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.618  0.056  0.075  0.034  2.783  3.126 × 10^{4}
100. GeV 1.001 × 10^{5} 2.643  0.073  0.099  0.042  2.857  3.835 × 10^{4}
140. GeV 1.401 × 10^{5} 2.680  0.107  0.149  0.059  2.995  5.202 × 10^{4}
200. GeV 2.001 × 10^{5} 2.719  0.161  0.228  0.084  3.192  7.142 × 10^{4}
300. GeV 3.001 × 10^{5} 2.763  0.255  0.363  0.125  3.505  1.013 × 10^{5}
400. GeV 4.001 × 10^{5} 2.794  0.351  0.503  0.167  3.815  1.286 × 10^{5}
800. GeV 8.001 × 10^{5} 2.870  0.755  1.086  0.337  5.048  2.195 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.895  0.963  1.388  0.424  5.670  2.568 × 10^{5}
1.04 TeV 1.042 × 10^{6} 2.899  1.007  1.450  0.442  5.799 Muon critical energy
1.40 TeV 1.400 × 10^{6} 2.932  1.383  1.988  0.601  6.905  3.207 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.972  2.028  2.909  0.870  8.780  3.976 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.019  3.109  4.441  1.334  11.903  4.950 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.052  4.209  5.994  1.805  15.061  5.696 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.135  8.664  12.253  3.768  27.819  7.620 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.162  10.917  15.405  4.779  34.262  8.267 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.203  15.413  21.685  6.862  47.163  9.258 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.248  22.214  31.158  10.062  66.682  1.032 × 10^{6}
30.0 TeV 3.000 × 10^{7} 3.299  33.539  46.920  15.618  99.376  1.154 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.336  44.924  62.734  21.320 132.314  1.241 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.428  90.574 126.040  45.251 265.293  1.451 × 10^{6}
100. TeV 1.000 × 10^{8} 3.458 113.459 157.731  57.657 332.305  1.518 × 10^{6}