Muons in carbon tetrachloride (CCl_{4})

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.49107 & 1.594 & 166.3 & 0.19018 & 3.0116 & 0.1773 & 2.9165 & 4.7712 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 6.320  6.320  8.817 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 4.951  4.951  1.604 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.883  3.883  2.988 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.025  3.025  5.946 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.590  2.590  9.542 × 10^{0}
80.0 MeV 1.527 × 10^{2} 1.957  1.957  2.786 × 10^{1}
100. MeV 1.764 × 10^{2} 1.843  1.843  3.842 × 10^{1}
140. MeV 2.218 × 10^{2} 1.729  1.730  6.092 × 10^{1}
200. MeV 2.868 × 10^{2} 1.669  1.669  9.636 × 10^{1}
277. MeV 3.673 × 10^{2} 1.654  0.000  1.655 Minimum ionization
300. MeV 3.917 × 10^{2} 1.655  0.000  1.656  1.567 × 10^{2}
400. MeV 4.945 × 10^{2} 1.671  0.000  0.000  1.671  2.168 × 10^{2}
800. MeV 8.995 × 10^{2} 1.757  0.000  0.000  1.757  4.501 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.793  0.000  0.000  1.794  5.627 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.850  0.001  0.000  0.001  1.852  7.820 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.913  0.001  0.001  0.001  1.915  1.100 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.983  0.002  0.001  0.001  1.988  1.612 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.031  0.003  0.002  0.002  2.038  2.109 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.140  0.007  0.007  0.004  2.158  4.010 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.172  0.009  0.010  0.004  2.196  4.928 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.219  0.014  0.016  0.006  2.255  6.724 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.265  0.022  0.025  0.009  2.322  9.345 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.315  0.036  0.044  0.013  2.408  1.357 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.348  0.051  0.065  0.017  2.480  1.766 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.422  0.115  0.156  0.032  2.725  3.302 × 10^{4}
100. GeV 1.001 × 10^{5} 2.445  0.148  0.205  0.040  2.839  4.021 × 10^{4}
140. GeV 1.401 × 10^{5} 2.480  0.218  0.307  0.056  3.061  5.378 × 10^{4}
200. GeV 2.001 × 10^{5} 2.516  0.327  0.468  0.079  3.391  7.240 × 10^{4}
300. GeV 3.001 × 10^{5} 2.557  0.515  0.740  0.118  3.930  9.977 × 10^{4}
400. GeV 4.001 × 10^{5} 2.585  0.709  1.022  0.158  4.474  1.236 × 10^{5}
538. GeV 5.381 × 10^{5} 2.615  0.983  1.420  0.212  5.231 Muon critical energy
800. GeV 8.001 × 10^{5} 2.656  1.513  2.183  0.319  6.671  1.964 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.679  1.927  2.780  0.400  7.786  2.241 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.713  2.759  3.970  0.568  10.010  2.693 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.751  4.034  5.790  0.821  13.397  3.209 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.794  6.166  8.816  1.257  19.034  3.833 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.825  8.331  11.879  1.701  24.736  4.292 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.901  17.076  24.201  3.543  47.722  5.436 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.926  21.491  30.400  4.491  59.308  5.811 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.964  30.303  42.759  6.440  82.467  6.381 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.005  43.618  61.386  9.431 117.440  6.987 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.053  65.758  92.394  14.612 175.818  7.679 × 10^{5}
40.0 TeV 4.000 × 10^{7} 3.087  87.991 123.491  19.923 234.492  8.170 × 10^{5}
80.0 TeV 8.000 × 10^{7} 3.172 177.123 247.966  42.154 470.416  9.350 × 10^{5}
100. TeV 1.000 × 10^{8} 3.200 221.794 310.268  53.656 588.918  9.730 × 10^{5}