Muons in carbon (graphite) (C)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
6 (C) 12.0107(8)  2.210  78.0 0.20762 2.9532 −0.0090 2.4817 2.8926  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.114  7.114  7.773 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.548  5.548  1.421 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.329  4.329  2.659 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.353  3.353  5.320 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.858  2.858  8.571 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.124  2.124  2.533 × 10^{1}
100. MeV 1.764 × 10^{2} 1.989  1.989  3.508 × 10^{1}
140. MeV 2.218 × 10^{2} 1.851  1.851  5.603 × 10^{1}
200. MeV 2.868 × 10^{2} 1.772  1.772  8.928 × 10^{1}
300. MeV 3.917 × 10^{2} 1.742  0.000  1.743  1.464 × 10^{2}
317. MeV 4.096 × 10^{2} 1.742  0.000  1.742 Minimum ionization
400. MeV 4.945 × 10^{2} 1.748  0.000  1.749  2.037 × 10^{2}
800. MeV 8.995 × 10^{2} 1.817  0.000  0.000  1.817  4.282 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.848  0.000  0.000  1.848  5.373 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.898  0.000  0.001  1.899  7.506 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.954  0.000  0.000  0.001  1.955  1.062 × 10^{3}
3.00 GeV 3.104 × 10^{3} 2.017  0.001  0.001  0.001  2.020  1.564 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.061  0.001  0.001  0.002  2.065  2.054 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.161  0.003  0.003  0.004  2.171  3.937 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.192  0.004  0.004  0.005  2.205  4.851 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.236  0.006  0.007  0.007  2.255  6.643 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.280  0.010  0.011  0.009  2.310  9.270 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.328  0.016  0.019  0.013  2.376  1.354 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.361  0.022  0.028  0.018  2.429  1.770 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.436  0.050  0.068  0.034  2.589  3.362 × 10^{4}
100. GeV 1.001 × 10^{5} 2.460  0.065  0.089  0.042  2.657  4.125 × 10^{4}
140. GeV 1.401 × 10^{5} 2.495  0.097  0.134  0.059  2.785  5.595 × 10^{4}
200. GeV 2.001 × 10^{5} 2.531  0.145  0.206  0.084  2.966  7.682 × 10^{4}
300. GeV 3.001 × 10^{5} 2.573  0.230  0.327  0.125  3.255  1.090 × 10^{5}
400. GeV 4.001 × 10^{5} 2.602  0.317  0.453  0.167  3.540  1.384 × 10^{5}
800. GeV 8.001 × 10^{5} 2.674  0.681  0.981  0.338  4.673  2.365 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.697  0.869  1.254  0.424  5.244  2.768 × 10^{5}
1.06 TeV 1.057 × 10^{6} 2.703  0.923  1.331  0.449  5.406 Muon critical energy
1.40 TeV 1.400 × 10^{6} 2.732  1.248  1.797  0.602  6.379  3.459 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.770  1.830  2.630  0.871  8.102  4.292 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.814  2.806  4.016  1.335  10.972  5.349 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.846  3.799  5.422  1.807  13.875  6.158 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.923  7.821  11.088  3.773  25.605  8.248 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.949  9.855  13.942  4.785  31.531  8.951 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.987  13.913  19.628  6.871  43.400  1.003 × 10^{6}
20.0 TeV 2.000 × 10^{7} 3.029  20.052  28.206  10.076  61.364  1.118 × 10^{6}
30.0 TeV 3.000 × 10^{7} 3.078  30.273  42.478  15.640  91.469  1.251 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.113  40.549  56.796  21.350 121.808  1.346 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.199  81.720 114.122  45.316 244.358  1.573 × 10^{6}
100. TeV 1.000 × 10^{8} 3.227 102.350 142.820  57.740 306.137  1.646 × 10^{6}