Muons in carbon dioxide gas (CO_{2})

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.49989 & 1.842 × 10^{−3} & 85.0 & 0.11768 & 3.3227 & 1.6294 & 4.1825 & 10.1537 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.057  7.057  7.842 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.508  5.508  1.433 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.304  4.304  2.679 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.341  3.341  5.353 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.854  2.854  8.612 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.145  2.145  2.529 × 10^{1}
100. MeV 1.764 × 10^{2} 2.018  2.018  3.493 × 10^{1}
140. MeV 2.218 × 10^{2} 1.894  1.894  5.549 × 10^{1}
200. MeV 2.868 × 10^{2} 1.831  1.831  8.783 × 10^{1}
257. MeV 3.471 × 10^{2} 1.819  0.000  1.820 Minimum ionization
300. MeV 3.917 × 10^{2} 1.823  0.000  1.823  1.427 × 10^{2}
400. MeV 4.945 × 10^{2} 1.848  0.000  1.848  1.972 × 10^{2}
800. MeV 8.995 × 10^{2} 1.972  0.000  0.000  1.972  4.066 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.024  0.000  0.000  2.025  5.066 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.109  0.000  0.001  2.111  6.999 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.206  0.001  0.000  0.001  2.208  9.776 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.319  0.001  0.001  0.001  2.322  1.418 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.401  0.002  0.001  0.002  2.405  1.841 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.567  0.004  0.003  0.004  2.578  3.439 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.615  0.005  0.005  0.005  2.630  4.207 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.683  0.007  0.008  0.007  2.705  5.705 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.749  0.011  0.013  0.009  2.783  7.890 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.818  0.019  0.023  0.013  2.874  1.142 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.863  0.027  0.034  0.017  2.941  1.486 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.960  0.061  0.081  0.034  3.136  2.800 × 10^{4}
100. GeV 1.001 × 10^{5} 2.989  0.079  0.107  0.042  3.217  3.430 × 10^{4}
140. GeV 1.401 × 10^{5} 3.029  0.116  0.161  0.058  3.365  4.645 × 10^{4}
200. GeV 2.001 × 10^{5} 3.071  0.174  0.247  0.083  3.575  6.374 × 10^{4}
300. GeV 3.001 × 10^{5} 3.115  0.275  0.392  0.124  3.907  9.049 × 10^{4}
400. GeV 4.001 × 10^{5} 3.146  0.379  0.543  0.165  4.234  1.151 × 10^{5}
800. GeV 8.001 × 10^{5} 3.219  0.813  1.172  0.334  5.539  1.974 × 10^{5}
1.00 TeV 1.000 × 10^{6} 3.243  1.037  1.497  0.420  6.197  2.315 × 10^{5}
1.09 TeV 1.095 × 10^{6} 3.252  1.143  1.648  0.461  6.505 Muon critical energy
1.40 TeV 1.400 × 10^{6} 3.278  1.489  2.143  0.595  7.505  2.901 × 10^{5}
2.00 TeV 2.000 × 10^{6} 3.316  2.181  3.133  0.862  9.493  3.611 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.360  3.342  4.781  1.320  12.804  4.515 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.392  4.523  6.451  1.786  16.152  5.208 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.469  9.300  13.178  3.728  29.675  7.008 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.495  11.714  16.565  4.728  36.502  7.615 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.534  16.532  23.316  6.787  50.168  8.546 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.575  23.817  33.496  9.949  70.838  9.548 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.624  35.946  50.437  15.437 105.444  1.070 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.659  48.136  67.432  21.069 140.295  1.152 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.745  97.010 135.468  44.687 280.911  1.349 × 10^{6}
100. TeV 1.000 × 10^{8} 3.773 121.509 169.526  56.926 351.734  1.413 × 10^{6}