Muons in carbon (compact) (C)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
6 (C) [12.0107(8)] 2.265  78.0 0.26142 2.8697 −0.0178 2.3415 2.8680  0.12
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.116  7.116  7.772 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.549  5.549  1.420 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.331  4.331  2.658 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.355  3.355  5.318 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.861  2.861  8.567 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.126  2.127  2.531 × 10^{1}
100. MeV 1.764 × 10^{2} 1.991  1.992  3.505 × 10^{1}
140. MeV 2.218 × 10^{2} 1.854  1.854  5.597 × 10^{1}
200. MeV 2.868 × 10^{2} 1.775  1.775  8.917 × 10^{1}
300. MeV 3.917 × 10^{2} 1.745  0.000  1.745  1.462 × 10^{2}
317. MeV 4.096 × 10^{2} 1.745  0.000  1.745 Minimum ionization
400. MeV 4.945 × 10^{2} 1.751  0.000  1.751  2.034 × 10^{2}
800. MeV 8.995 × 10^{2} 1.819  0.000  0.000  1.820  4.275 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.850  0.000  0.000  1.851  5.365 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.900  0.000  0.001  1.901  7.496 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.955  0.000  0.000  0.001  1.957  1.060 × 10^{3}
3.00 GeV 3.104 × 10^{3} 2.018  0.001  0.001  0.001  2.021  1.563 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.062  0.001  0.001  0.002  2.066  2.052 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.161  0.003  0.003  0.004  2.171  3.935 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.191  0.004  0.004  0.005  2.204  4.849 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.234  0.006  0.007  0.007  2.254  6.643 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.278  0.010  0.011  0.009  2.308  9.272 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.326  0.016  0.019  0.013  2.374  1.354 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.359  0.022  0.028  0.018  2.427  1.770 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.434  0.050  0.068  0.034  2.587  3.364 × 10^{4}
100. GeV 1.001 × 10^{5} 2.458  0.065  0.089  0.042  2.655  4.127 × 10^{4}
140. GeV 1.401 × 10^{5} 2.493  0.097  0.134  0.059  2.783  5.598 × 10^{4}
200. GeV 2.001 × 10^{5} 2.529  0.145  0.206  0.084  2.964  7.687 × 10^{4}
300. GeV 3.001 × 10^{5} 2.571  0.230  0.327  0.125  3.253  1.091 × 10^{5}
400. GeV 4.001 × 10^{5} 2.600  0.317  0.453  0.167  3.538  1.385 × 10^{5}
800. GeV 8.001 × 10^{5} 2.672  0.681  0.981  0.338  4.671  2.366 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.695  0.869  1.254  0.424  5.242  2.770 × 10^{5}
1.06 TeV 1.057 × 10^{6} 2.701  0.922  1.330  0.449  5.402 Muon critical energy
1.40 TeV 1.400 × 10^{6} 2.730  1.248  1.797  0.602  6.377  3.461 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.768  1.830  2.630  0.871  8.100  4.294 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.812  2.806  4.016  1.335  10.970  5.351 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.844  3.799  5.422  1.807  13.873  6.160 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.921  7.821  11.088  3.773  25.603  8.250 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.947  9.855  13.942  4.785  31.529  8.953 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.986  13.913  19.628  6.871  43.398  1.003 × 10^{6}
20.0 TeV 2.000 × 10^{7} 3.027  20.052  28.206  10.076  61.362  1.119 × 10^{6}
30.0 TeV 3.000 × 10^{7} 3.076  30.273  42.478  15.640  91.467  1.251 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.111  40.549  56.796  21.350 121.806  1.346 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.197  81.720 114.122  45.316 244.356  1.573 × 10^{6}
100. TeV 1.000 × 10^{8} 3.225 102.350 142.820  57.740 306.136  1.646 × 10^{6}