Muons in carbon (amorphous) (C)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
6 (C) 12.0107(8)  2.000  78.0 0.20240 3.0036 −0.0351 2.4860 2.9925  0.10
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.117  7.117  7.771 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.550  5.551  1.420 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.332  4.332  2.658 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.357  3.357  5.317 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.862  2.862  8.564 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.129  2.129  2.529 × 10^{1}
100. MeV 1.764 × 10^{2} 1.994  1.994  3.502 × 10^{1}
140. MeV 2.218 × 10^{2} 1.857  1.857  5.591 × 10^{1}
200. MeV 2.868 × 10^{2} 1.778  1.779  8.905 × 10^{1}
300. MeV 3.917 × 10^{2} 1.749  0.000  1.749  1.459 × 10^{2}
313. MeV 4.055 × 10^{2} 1.749  0.000  1.749 Minimum ionization
400. MeV 4.945 × 10^{2} 1.755  0.000  1.756  2.030 × 10^{2}
800. MeV 8.995 × 10^{2} 1.824  0.000  0.000  1.825  4.266 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.855  0.000  0.000  1.856  5.353 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.906  0.000  0.001  1.907  7.478 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.961  0.000  0.000  0.001  1.963  1.058 × 10^{3}
3.00 GeV 3.104 × 10^{3} 2.025  0.001  0.001  0.001  2.028  1.558 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.069  0.001  0.001  0.002  2.073  2.046 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.169  0.003  0.003  0.004  2.179  3.922 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.200  0.004  0.004  0.005  2.212  4.832 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.243  0.006  0.007  0.007  2.263  6.619 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.288  0.010  0.011  0.009  2.318  9.237 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.336  0.016  0.019  0.013  2.384  1.349 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.368  0.022  0.028  0.018  2.436  1.764 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.444  0.050  0.068  0.034  2.596  3.351 × 10^{4}
100. GeV 1.001 × 10^{5} 2.467  0.065  0.089  0.042  2.665  4.112 × 10^{4}
140. GeV 1.401 × 10^{5} 2.502  0.097  0.134  0.059  2.792  5.577 × 10^{4}
200. GeV 2.001 × 10^{5} 2.539  0.145  0.206  0.084  2.974  7.659 × 10^{4}
300. GeV 3.001 × 10^{5} 2.580  0.230  0.327  0.125  3.262  1.087 × 10^{5}
400. GeV 4.001 × 10^{5} 2.610  0.317  0.453  0.167  3.547  1.381 × 10^{5}
800. GeV 8.001 × 10^{5} 2.681  0.681  0.981  0.338  4.681  2.359 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.705  0.869  1.254  0.424  5.252  2.762 × 10^{5}
1.06 TeV 1.060 × 10^{6} 2.711  0.925  1.335  0.451  5.422 Muon critical energy
1.40 TeV 1.400 × 10^{6} 2.740  1.248  1.797  0.602  6.387  3.452 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.778  1.830  2.630  0.871  8.109  4.284 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.822  2.806  4.016  1.335  10.979  5.340 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.853  3.799  5.422  1.807  13.882  6.148 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.931  7.821  11.088  3.773  25.613  8.238 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.956  9.855  13.942  4.785  31.539  8.940 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.995  13.913  19.628  6.871  43.408  1.002 × 10^{6}
20.0 TeV 2.000 × 10^{7} 3.037  20.052  28.206  10.076  61.371  1.117 × 10^{6}
30.0 TeV 3.000 × 10^{7} 3.085  30.273  42.478  15.640  91.476  1.250 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.120  40.549  56.796  21.350 121.816  1.344 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.206  81.720 114.122  45.316 244.366  1.572 × 10^{6}
100. TeV 1.000 × 10^{8} 3.235 102.350 142.820  57.740 306.145  1.645 × 10^{6}