Muons in calcium tungstate (CaWO_{4})

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.43761 & 6.062 & 395.0 & 0.06210 & 3.2649 & 0.0323 & 3.8932 & 5.2603 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.930  4.930  1.144 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.885  3.885  2.067 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.063  3.063  3.826 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.400  2.400  7.563 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.063  2.063  1.209 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.567  1.567  3.501 × 10^{1}
100. MeV 1.764 × 10^{2} 1.477  1.477  4.819 × 10^{1}
140. MeV 2.218 × 10^{2} 1.389  1.389  7.624 × 10^{1}
200. MeV 2.868 × 10^{2} 1.345  1.345  1.203 × 10^{2}
257. MeV 3.471 × 10^{2} 1.336  0.000  1.337 Minimum ionization
300. MeV 3.917 × 10^{2} 1.339  0.000  0.000  1.339  1.950 × 10^{2}
400. MeV 4.945 × 10^{2} 1.355  0.000  0.000  1.356  2.693 × 10^{2}
800. MeV 8.995 × 10^{2} 1.437  0.001  0.000  1.438  5.555 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.470  0.001  0.000  1.471  6.930 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.523  0.002  0.001  1.526  9.597 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.581  0.003  0.001  0.001  1.586  1.345 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.647  0.005  0.003  0.001  1.656  1.961 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.693  0.007  0.005  0.002  1.706  2.556 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.797  0.017  0.015  0.003  1.833  4.809 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.828  0.022  0.022  0.004  1.877  5.887 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.874  0.034  0.036  0.006  1.950  7.976 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.919  0.053  0.058  0.008  2.039  1.098 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.967  0.087  0.102  0.012  2.169  1.573 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.999  0.123  0.151  0.015  2.289  2.022 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.071  0.279  0.363  0.030  2.744  3.615 × 10^{4}
100. GeV 1.001 × 10^{5} 2.093  0.362  0.478  0.037  2.970  4.315 × 10^{4}
140. GeV 1.401 × 10^{5} 2.125  0.531  0.715  0.052  3.423  5.569 × 10^{4}
200. GeV 2.001 × 10^{5} 2.158  0.796  1.089  0.073  4.117  7.166 × 10^{4}
219. GeV 2.191 × 10^{5} 2.166  0.880  1.206  0.080  4.333 Muon critical energy
300. GeV 3.001 × 10^{5} 2.195  1.248  1.716  0.110  5.269  9.309 × 10^{4}
400. GeV 4.001 × 10^{5} 2.221  1.716  2.365  0.146  6.449  1.102 × 10^{5}
800. GeV 8.001 × 10^{5} 2.283  3.646  5.030  0.296  11.256  1.566 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.304  4.637  6.394  0.372  13.708  1.727 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.335  6.625  9.114  0.526  18.601  1.976 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.368  9.665  13.265  0.761  26.060  2.248 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.406  14.739  20.163  1.165  38.474  2.562 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.434  19.881  27.136  1.574  51.026  2.787 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.502  40.610  55.166  3.275 101.554  3.332 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.524  51.055  69.257  4.149 126.986  3.507 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.558  71.891  97.370  5.943 177.763  3.772 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.595 103.327 139.721  8.694 254.339  4.053 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.637 155.656 210.187  13.453 381.935  4.372 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.668 208.172 280.821  18.327 509.989  4.598 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.743 418.548 563.544  38.698 1023.535  5.140 × 10^{5}
100. TeV 1.000 × 10^{8} 2.768 523.913 705.033  49.228 1280.943  5.315 × 10^{5}