Muons in calcium sulfate (CaSO_{4})

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.49950 & 2.960 & 152.3 & 0.07708 & 3.4495 & 0.0587 & 3.1229 & 3.9388 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 6.510  6.510  8.551 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.098  5.098  1.557 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.995  3.995  2.901 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.111  3.111  5.777 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.663  2.663  9.273 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.003  2.004  2.712 × 10^{1}
100. MeV 1.764 × 10^{2} 1.882  1.882  3.745 × 10^{1}
140. MeV 2.218 × 10^{2} 1.760  1.760  5.953 × 10^{1}
200. MeV 2.868 × 10^{2} 1.693  1.693  9.441 × 10^{1}
288. MeV 3.788 × 10^{2} 1.673  0.000  1.673 Minimum ionization
300. MeV 3.917 × 10^{2} 1.673  0.000  1.673  1.540 × 10^{2}
400. MeV 4.945 × 10^{2} 1.685  0.000  1.685  2.136 × 10^{2}
800. MeV 8.995 × 10^{2} 1.763  0.000  0.000  1.763  4.456 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.796  0.000  0.000  1.797  5.579 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.851  0.001  0.000  0.001  1.852  7.770 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.910  0.001  0.000  0.001  1.913  1.095 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.977  0.002  0.001  0.001  1.982  1.608 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.024  0.003  0.002  0.002  2.030  2.107 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.130  0.006  0.006  0.004  2.146  4.017 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.162  0.008  0.008  0.005  2.183  4.940 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.208  0.012  0.014  0.006  2.241  6.748 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.254  0.019  0.022  0.009  2.305  9.386 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.304  0.032  0.039  0.013  2.387  1.365 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.337  0.045  0.057  0.017  2.456  1.777 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.413  0.101  0.137  0.033  2.684  3.333 × 10^{4}
100. GeV 1.001 × 10^{5} 2.437  0.131  0.180  0.041  2.788  4.064 × 10^{4}
140. GeV 1.401 × 10^{5} 2.472  0.192  0.269  0.057  2.990  5.449 × 10^{4}
200. GeV 2.001 × 10^{5} 2.509  0.289  0.410  0.080  3.288  7.361 × 10^{4}
300. GeV 3.001 × 10^{5} 2.550  0.454  0.649  0.120  3.774  1.020 × 10^{5}
400. GeV 4.001 × 10^{5} 2.580  0.625  0.898  0.160  4.263  1.269 × 10^{5}
599. GeV 5.993 × 10^{5} 2.621  0.975  1.405  0.241  5.243 Muon critical energy
800. GeV 8.001 × 10^{5} 2.651  1.335  1.924  0.324  6.235  2.040 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.674  1.701  2.451  0.407  7.234  2.338 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.710  2.436  3.502  0.577  9.226  2.826 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.748  3.564  5.110  0.836  12.258  3.389 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.791  5.450  7.783  1.280  17.305  4.072 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.823  7.366  10.490  1.731  22.410  4.579 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.900  15.106  21.382  3.608  42.998  5.845 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.926  19.014  26.863  4.575  53.378  6.262 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.965  26.815  37.791  6.563  74.134  6.895 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.007  38.603  54.263  9.614 105.488  7.570 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.055  58.210  81.676  14.904 157.845  8.340 × 10^{5}
40.0 TeV 4.000 × 10^{7} 3.090  77.902 109.168  20.328 210.488  8.887 × 10^{5}
80.0 TeV 8.000 × 10^{7} 3.176 156.854 219.222  43.050 422.302  1.020 × 10^{6}
100. TeV 1.000 × 10^{8} 3.204 196.424 274.308  54.814 528.751  1.062 × 10^{6}