Muons in calcium oxide (CaO)

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.49929 & 3.300 & 176.1 & 0.12128 & 3.1936 & −0.0172 & 3.0171 & 4.1209 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 6.373  6.373  8.750 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 4.994  4.994  1.591 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.918  3.918  2.963 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.053  3.053  5.894 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.615  2.615  9.456 × 10^{0}
80.0 MeV 1.527 × 10^{2} 1.968  1.968  2.764 × 10^{1}
100. MeV 1.764 × 10^{2} 1.850  1.850  3.815 × 10^{1}
140. MeV 2.218 × 10^{2} 1.732  1.732  6.060 × 10^{1}
200. MeV 2.868 × 10^{2} 1.668  1.668  9.603 × 10^{1}
284. MeV 3.748 × 10^{2} 1.650  0.000  1.650 Minimum ionization
300. MeV 3.917 × 10^{2} 1.650  0.000  1.651  1.565 × 10^{2}
400. MeV 4.945 × 10^{2} 1.663  0.000  0.000  1.664  2.168 × 10^{2}
800. MeV 8.995 × 10^{2} 1.745  0.000  0.000  1.745  4.515 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.779  0.000  0.000  1.780  5.649 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.835  0.001  0.000  0.001  1.837  7.860 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.896  0.001  0.001  0.001  1.898  1.107 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.964  0.002  0.001  0.001  1.969  1.624 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.012  0.003  0.002  0.002  2.019  2.125 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.119  0.007  0.007  0.004  2.138  4.043 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.152  0.010  0.010  0.005  2.176  4.970 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.198  0.015  0.017  0.006  2.236  6.782 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.245  0.023  0.027  0.009  2.304  9.424 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.295  0.038  0.047  0.013  2.393  1.368 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.328  0.054  0.069  0.017  2.468  1.779 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.404  0.122  0.165  0.032  2.724  3.319 × 10^{4}
100. GeV 1.001 × 10^{5} 2.428  0.158  0.218  0.040  2.844  4.038 × 10^{4}
140. GeV 1.401 × 10^{5} 2.463  0.232  0.326  0.056  3.077  5.390 × 10^{4}
200. GeV 2.001 × 10^{5} 2.499  0.348  0.497  0.079  3.424  7.237 × 10^{4}
300. GeV 3.001 × 10^{5} 2.541  0.548  0.785  0.119  3.993  9.939 × 10^{4}
400. GeV 4.001 × 10^{5} 2.570  0.754  1.084  0.158  4.567  1.228 × 10^{5}
507. GeV 5.073 × 10^{5} 2.595  0.981  1.413  0.201  5.190 Muon critical energy
800. GeV 8.001 × 10^{5} 2.642  1.608  2.317  0.320  6.887  1.936 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.665  2.049  2.950  0.402  8.065  2.205 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.700  2.933  4.212  0.569  10.415  2.640 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.738  4.288  6.143  0.824  13.993  3.135 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.782  6.554  9.352  1.262  19.950  3.731 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.813  8.854  12.600  1.706  25.974  4.169 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.891  18.144  25.668  3.555  50.259  5.257 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.916  22.833  32.243  4.506  62.499  5.613 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.955  32.194  45.354  6.462  86.966  6.153 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.997  46.335  65.116  9.465 123.914  6.728 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.045  69.853  97.999  14.666 185.563  7.383 × 10^{5}
40.0 TeV 4.000 × 10^{7} 3.080  93.468 130.972  19.997 247.518  7.848 × 10^{5}
80.0 TeV 8.000 × 10^{7} 3.166 188.140 262.969  42.322 496.597  8.967 × 10^{5}
100. TeV 1.000 × 10^{8} 3.195 235.584 329.037  53.876 621.691  9.326 × 10^{5}