Muons in calcium fluoride (CaF_{2})

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.49670 & 3.180 & 166.0 & 0.06942 & 3.5263 & 0.0676 & 3.1683 & 4.0653 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 6.395  6.395  8.715 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.009  5.009  1.586 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.928  3.928  2.953 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.060  3.060  5.877 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.620  2.620  9.431 × 10^{0}
80.0 MeV 1.527 × 10^{2} 1.975  1.975  2.756 × 10^{1}
100. MeV 1.764 × 10^{2} 1.857  1.857  3.803 × 10^{1}
140. MeV 2.218 × 10^{2} 1.738  1.738  6.039 × 10^{1}
200. MeV 2.868 × 10^{2} 1.673  1.674  9.570 × 10^{1}
288. MeV 3.788 × 10^{2} 1.655  0.000  1.655 Minimum ionization
300. MeV 3.917 × 10^{2} 1.655  0.000  1.656  1.559 × 10^{2}
400. MeV 4.945 × 10^{2} 1.667  0.000  1.668  2.162 × 10^{2}
800. MeV 8.995 × 10^{2} 1.747  0.000  0.000  1.748  4.504 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.781  0.000  0.000  1.782  5.637 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.835  0.001  0.000  0.001  1.837  7.847 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.895  0.001  0.001  0.001  1.897  1.106 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.962  0.002  0.001  0.001  1.966  1.623 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.008  0.003  0.002  0.002  2.015  2.125 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.114  0.007  0.006  0.004  2.131  4.049 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.146  0.009  0.009  0.005  2.168  4.979 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.192  0.013  0.014  0.006  2.226  6.799 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.238  0.020  0.024  0.009  2.291  9.454 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.287  0.034  0.041  0.013  2.375  1.374 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.321  0.047  0.060  0.017  2.446  1.788 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.396  0.107  0.145  0.033  2.682  3.348 × 10^{4}
100. GeV 1.001 × 10^{5} 2.420  0.139  0.191  0.040  2.791  4.079 × 10^{4}
140. GeV 1.401 × 10^{5} 2.455  0.204  0.286  0.056  3.002  5.460 × 10^{4}
200. GeV 2.001 × 10^{5} 2.491  0.307  0.437  0.080  3.315  7.361 × 10^{4}
300. GeV 3.001 × 10^{5} 2.532  0.482  0.691  0.119  3.825  1.017 × 10^{5}
400. GeV 4.001 × 10^{5} 2.562  0.664  0.955  0.159  4.339  1.262 × 10^{5}
565. GeV 5.653 × 10^{5} 2.597  0.971  1.400  0.225  5.194 Muon critical energy
800. GeV 8.001 × 10^{5} 2.633  1.417  2.042  0.322  6.414  2.016 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.656  1.805  2.602  0.404  7.467  2.304 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.691  2.585  3.716  0.573  9.565  2.777 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.729  3.780  5.420  0.829  12.759  3.318 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.772  5.779  8.254  1.270  18.076  3.973 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.804  7.809  11.123  1.718  23.454  4.458 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.881  16.010  22.666  3.580  45.137  5.666 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.906  20.150  28.474  4.538  56.068  6.063 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.945  28.413  40.055  6.509  77.922  6.665 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.986  40.898  57.512  9.534 110.931  7.307 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.034  61.665  86.559  14.777 166.036  8.039 × 10^{5}
40.0 TeV 4.000 × 10^{7} 3.069  82.521 115.688  20.152 221.431  8.559 × 10^{5}
80.0 TeV 8.000 × 10^{7} 3.155 166.132 232.299  42.665 444.251  9.810 × 10^{5}
100. TeV 1.000 × 10^{8} 3.183 208.035 290.668  54.318 556.204  1.021 × 10^{6}