Muons in calcium carbonate (CaCO_{3})

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.49955 & 2.800 & 136.4 & 0.08301 & 3.4120 & 0.0492 & 3.0549 & 3.7738 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 6.613  6.613  8.408 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.175  5.175  1.532 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.053  4.054  2.857 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.154  3.154  5.692 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.699  2.699  9.141 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.027  2.027  2.677 × 10^{1}
100. MeV 1.764 × 10^{2} 1.903  1.903  3.698 × 10^{1}
140. MeV 2.218 × 10^{2} 1.778  1.778  5.883 × 10^{1}
200. MeV 2.868 × 10^{2} 1.708  1.708  9.339 × 10^{1}
297. MeV 3.884 × 10^{2} 1.686  0.000  1.686 Minimum ionization
300. MeV 3.917 × 10^{2} 1.686  0.000  1.686  1.525 × 10^{2}
400. MeV 4.945 × 10^{2} 1.697  0.000  1.697  2.116 × 10^{2}
800. MeV 8.995 × 10^{2} 1.773  0.000  0.000  1.773  4.422 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.806  0.000  0.000  1.807  5.539 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.859  0.001  0.000  0.001  1.861  7.719 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.918  0.001  0.000  0.001  1.920  1.089 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.985  0.002  0.001  0.001  1.989  1.600 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.031  0.002  0.002  0.002  2.037  2.097 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.136  0.006  0.006  0.004  2.151  4.001 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.168  0.008  0.008  0.005  2.188  4.923 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.213  0.012  0.013  0.006  2.244  6.727 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.259  0.018  0.021  0.009  2.308  9.361 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.309  0.030  0.036  0.013  2.388  1.362 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.342  0.042  0.053  0.017  2.455  1.775 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.418  0.095  0.129  0.033  2.675  3.333 × 10^{4}
100. GeV 1.001 × 10^{5} 2.442  0.123  0.169  0.041  2.775  4.067 × 10^{4}
140. GeV 1.401 × 10^{5} 2.476  0.181  0.253  0.057  2.968  5.460 × 10^{4}
200. GeV 2.001 × 10^{5} 2.513  0.272  0.387  0.081  3.253  7.390 × 10^{4}
300. GeV 3.001 × 10^{5} 2.555  0.428  0.612  0.121  3.716  1.026 × 10^{5}
400. GeV 4.001 × 10^{5} 2.584  0.589  0.846  0.161  4.181  1.280 × 10^{5}
631. GeV 6.316 × 10^{5} 2.631  0.973  1.402  0.256  5.262 Muon critical energy
800. GeV 8.001 × 10^{5} 2.656  1.259  1.813  0.326  6.054  2.071 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.679  1.604  2.311  0.410  7.004  2.378 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.714  2.298  3.302  0.581  8.895  2.883 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.752  3.362  4.819  0.841  11.774  3.468 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.796  5.142  7.342  1.287  16.567  4.181 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.827  6.949  9.896  1.742  21.415  4.710 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.905  14.255  20.176  3.631  40.968  6.038 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.930  17.944  25.349  4.603  50.828  6.475 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.969  25.307  35.664  6.605  70.545  7.140 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.011  36.434  51.213  9.678 100.336  7.850 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.060  54.944  77.086  15.005 150.094  8.660 × 10^{5}
40.0 TeV 4.000 × 10^{7} 3.095  73.535 103.033  20.468 200.132  9.235 × 10^{5}
80.0 TeV 8.000 × 10^{7} 3.181 148.069 206.906  43.362 401.518  1.062 × 10^{6}
100. TeV 1.000 × 10^{8} 3.209 185.424 258.899  55.217 502.749  1.106 × 10^{6}