Muons in calcium (Ca)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
20 (Ca) 40.078(4)  1.550  191.0 0.15643 3.0745 0.3228 3.1191 5.0396  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 6.282  6.282  8.902 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 4.927  4.927  1.617 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.867  3.867  3.007 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.015  3.015  5.975 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.582  2.582  9.583 × 10^{0}
80.0 MeV 1.527 × 10^{2} 1.950  1.950  2.797 × 10^{1}
100. MeV 1.764 × 10^{2} 1.837  1.837  3.856 × 10^{1}
140. MeV 2.218 × 10^{2} 1.725  1.725  6.114 × 10^{1}
200. MeV 2.868 × 10^{2} 1.668  1.668  9.664 × 10^{1}
267. MeV 3.577 × 10^{2} 1.655  0.000  1.656 Minimum ionization
300. MeV 3.917 × 10^{2} 1.657  0.000  1.657  1.569 × 10^{2}
400. MeV 4.945 × 10^{2} 1.674  0.000  0.000  1.675  2.170 × 10^{2}
800. MeV 8.995 × 10^{2} 1.766  0.000  0.000  1.767  4.494 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.804  0.001  0.000  1.805  5.613 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.864  0.001  0.000  0.001  1.866  7.791 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.929  0.001  0.001  0.001  1.933  1.095 × 10^{3}
3.00 GeV 3.104 × 10^{3} 2.003  0.002  0.002  0.001  2.008  1.602 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.053  0.004  0.003  0.002  2.062  2.093 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.167  0.009  0.009  0.004  2.188  3.969 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.201  0.012  0.012  0.004  2.230  4.874 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.250  0.018  0.020  0.006  2.294  6.642 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.298  0.028  0.032  0.008  2.367  9.215 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.350  0.045  0.056  0.012  2.464  1.335 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.384  0.064  0.082  0.016  2.547  1.734 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.461  0.145  0.197  0.032  2.835  3.221 × 10^{4}
100. GeV 1.001 × 10^{5} 2.484  0.188  0.259  0.039  2.971  3.910 × 10^{4}
140. GeV 1.401 × 10^{5} 2.519  0.276  0.387  0.055  3.237  5.199 × 10^{4}
200. GeV 2.001 × 10^{5} 2.556  0.414  0.591  0.078  3.638  6.946 × 10^{4}
300. GeV 3.001 × 10^{5} 2.597  0.650  0.932  0.117  4.297  9.473 × 10^{4}
400. GeV 4.001 × 10^{5} 2.627  0.894  1.287  0.156  4.964  1.164 × 10^{5}
446. GeV 4.465 × 10^{5} 2.638  1.010  1.455  0.174  5.277 Muon critical energy
800. GeV 8.001 × 10^{5} 2.698  1.906  2.745  0.314  7.665  1.807 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.721  2.427  3.493  0.395  9.037  2.047 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.757  3.473  4.987  0.560  11.777  2.434 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.795  5.076  7.269  0.810  15.951  2.870 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.838  7.755  11.063  1.240  22.897  3.391 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.870  10.474  14.901  1.677  29.923  3.772 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.947  21.453  30.341  3.493  58.235  4.713 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.973  26.993  38.108  4.426  72.501  5.020 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.012  38.053  53.599  6.345 101.010  5.486 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.053  54.760  76.946  9.290 144.050  5.980 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.102  82.538 115.792  14.388 215.821  6.544 × 10^{5}
40.0 TeV 4.000 × 10^{7} 3.137 110.428 154.742  19.612 287.919  6.944 × 10^{5}
80.0 TeV 8.000 × 10^{7} 3.223 222.227 310.667  41.472 577.589  7.905 × 10^{5}
100. TeV 1.000 × 10^{8} 3.251 278.250 388.710  52.780 722.992  8.214 × 10^{5}