Muons in caesium (Cs)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
55 (Cs)132.90545196(6) 1.873  488.0 0.18233 2.8866 0.5473 3.5914 6.9135  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.464  4.464  1.277 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.532  3.532  2.294 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.794  2.794  4.224 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.195  2.195  8.315 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.890  1.890  1.325 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.444  1.444  3.820 × 10^{1}
100. MeV 1.764 × 10^{2} 1.366  1.366  5.248 × 10^{1}
140. MeV 2.218 × 10^{2} 1.291  1.291  8.274 × 10^{1}
200. MeV 2.868 × 10^{2} 1.257  1.257  1.300 × 10^{2}
236. MeV 3.250 × 10^{2} 1.254  1.254 Minimum ionization
300. MeV 3.917 × 10^{2} 1.261  0.000  0.000  1.261  2.096 × 10^{2}
400. MeV 4.945 × 10^{2} 1.284  0.000  0.000  1.285  2.882 × 10^{2}
800. MeV 8.995 × 10^{2} 1.378  0.001  0.000  1.380  5.881 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.415  0.001  0.000  1.417  7.311 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.473  0.002  0.000  0.001  1.476  1.007 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.535  0.003  0.001  0.001  1.540  1.405 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.605  0.005  0.003  0.001  1.615  2.038 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.653  0.007  0.006  0.002  1.668  2.647 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.762  0.018  0.018  0.003  1.801  4.945 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.794  0.024  0.025  0.004  1.847  6.041 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.840  0.037  0.040  0.005  1.923  8.161 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.886  0.057  0.065  0.008  2.017  1.121 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.934  0.094  0.114  0.011  2.154  1.600 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.966  0.133  0.167  0.015  2.282  2.051 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.036  0.300  0.401  0.029  2.767  3.639 × 10^{4}
100. GeV 1.001 × 10^{5} 2.057  0.389  0.527  0.036  3.010  4.332 × 10^{4}
140. GeV 1.401 × 10^{5} 2.088  0.571  0.787  0.050  3.497  5.564 × 10^{4}
200. GeV 1.996 × 10^{5} 2.119  0.853  1.195  0.071  4.239 Muon critical energy
200. GeV 2.001 × 10^{5} 2.119  0.855  1.199  0.071  4.245  7.120 × 10^{4}
300. GeV 3.001 × 10^{5} 2.154  1.341  1.886  0.106  5.489  9.187 × 10^{4}
400. GeV 4.001 × 10^{5} 2.178  1.844  2.598  0.142  6.763  1.083 × 10^{5}
800. GeV 8.001 × 10^{5} 2.237  3.918  5.519  0.287  11.963  1.522 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.257  4.984  7.013  0.360  14.615  1.673 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.286  7.120  9.993  0.510  19.911  1.906 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.317  10.388  14.540  0.738  27.985  2.159 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.354  15.843  22.098  1.128  41.424  2.451 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.380  21.371  29.735  1.525  55.011  2.660 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.444  43.656  60.435  3.168 109.704  3.165 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.465  54.886  75.866  4.011 137.230  3.328 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.497  77.286 106.658  5.742 192.184  3.573 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.532 111.082 153.042  8.396 275.053  3.833 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.572 167.344 230.212  12.979 413.109  4.127 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.601 223.807 307.564  17.670 551.643  4.336 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.672 449.996 617.197  37.249 1107.116  4.838 × 10^{5}
100. TeV 1.000 × 10^{8} 2.696 563.280 772.160  47.360 1385.497  4.999 × 10^{5}