Muons in cadmium tungstate (CdWO_{4})

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.42747 & 7.900 & 468.3 & 0.12861 & 2.9150 & 0.0123 & 3.5941 & 5.3594 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.680  4.680  1.208 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.693  3.693  2.180 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.916  2.916  4.028 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.288  2.288  7.952 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.968  1.968  1.269 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.496  1.496  3.671 × 10^{1}
100. MeV 1.764 × 10^{2} 1.411  1.412  5.050 × 10^{1}
140. MeV 2.218 × 10^{2} 1.329  1.329  7.985 × 10^{1}
200. MeV 2.868 × 10^{2} 1.287  1.288  1.259 × 10^{2}
253. MeV 3.431 × 10^{2} 1.280  0.000  1.281 Minimum ionization
300. MeV 3.917 × 10^{2} 1.283  0.000  0.000  1.284  2.039 × 10^{2}
400. MeV 4.945 × 10^{2} 1.300  0.000  0.000  1.301  2.813 × 10^{2}
800. MeV 8.995 × 10^{2} 1.382  0.001  0.000  1.383  5.792 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.415  0.001  0.000  1.416  7.221 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.468  0.002  0.000  0.001  1.470  9.990 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.525  0.003  0.001  0.001  1.530  1.399 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.591  0.005  0.003  0.001  1.600  2.037 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.636  0.007  0.005  0.002  1.650  2.652 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.739  0.018  0.016  0.003  1.777  4.979 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.770  0.024  0.023  0.004  1.821  6.090 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.815  0.036  0.038  0.006  1.894  8.242 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.859  0.056  0.062  0.008  1.985  1.133 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.906  0.091  0.108  0.011  2.119  1.621 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.938  0.129  0.159  0.015  2.242  2.079 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.008  0.292  0.384  0.029  2.714  3.697 × 10^{4}
100. GeV 1.001 × 10^{5} 2.029  0.379  0.505  0.037  2.950  4.404 × 10^{4}
140. GeV 1.401 × 10^{5} 2.060  0.556  0.754  0.051  3.422  5.662 × 10^{4}
200. GeV 2.001 × 10^{5} 2.092  0.833  1.149  0.072  4.148  7.253 × 10^{4}
203. GeV 2.036 × 10^{5} 2.094  0.849  1.171  0.074  4.189 Muon critical energy
300. GeV 3.001 × 10^{5} 2.128  1.307  1.809  0.108  5.353  9.370 × 10^{4}
400. GeV 4.001 × 10^{5} 2.153  1.796  2.492  0.144  6.588  1.105 × 10^{5}
800. GeV 8.001 × 10^{5} 2.214  3.818  5.298  0.292  11.623  1.557 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.234  4.856  6.733  0.367  14.192  1.712 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.265  6.936  9.596  0.520  19.318  1.953 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.297  10.119  13.965  0.752  27.134  2.214 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.335  15.431  21.225  1.150  40.143  2.515 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.362  20.814  28.564  1.555  53.295  2.730 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.428  42.515  58.062  3.232 106.238  3.252 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.450  53.449  72.889  4.094 132.884  3.420 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.483  75.259 102.475  5.863 186.081  3.673 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.519 108.165 147.043  8.575 266.303  3.941 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.560 162.946 221.195  13.264 399.966  4.245 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.590 217.921 295.524  18.065 534.102  4.461 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.664 438.147 593.039  38.125 1071.976  4.979 × 10^{5}
100. TeV 1.000 × 10^{8} 2.688 548.444 741.930  48.490 1341.553  5.146 × 10^{5}