Muons in cadmium telluride (CdTe)

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.41665 & 6.200 & 539.3 & 0.24840 & 2.6665 & 0.0438 & 3.2836 & 5.9096 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.453  4.453  1.273 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.518  3.518  2.294 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.781  2.781  4.233 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.184  2.184  8.345 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.880  1.880  1.331 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.438  1.438  3.838 × 10^{1}
100. MeV 1.764 × 10^{2} 1.359  1.359  5.272 × 10^{1}
140. MeV 2.218 × 10^{2} 1.283  1.283  8.314 × 10^{1}
200. MeV 2.868 × 10^{2} 1.247  1.247  1.307 × 10^{2}
242. MeV 3.316 × 10^{2} 1.243  1.243 Minimum ionization
300. MeV 3.917 × 10^{2} 1.247  0.000  0.000  1.248  2.111 × 10^{2}
400. MeV 4.945 × 10^{2} 1.266  0.000  0.000  1.267  2.907 × 10^{2}
800. MeV 8.995 × 10^{2} 1.351  0.001  0.000  1.352  5.959 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.385  0.001  0.000  1.387  7.418 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.439  0.002  0.000  0.001  1.442  1.024 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.498  0.003  0.001  0.001  1.503  1.432 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.564  0.005  0.003  0.001  1.573  2.081 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.609  0.007  0.005  0.002  1.623  2.706 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.712  0.017  0.016  0.003  1.749  5.071 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.743  0.022  0.023  0.004  1.793  6.199 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.787  0.034  0.037  0.005  1.865  8.385 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.831  0.053  0.061  0.008  1.954  1.153 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.878  0.087  0.106  0.011  2.083  1.648 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.908  0.123  0.156  0.015  2.202  2.115 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.976  0.277  0.373  0.029  2.656  3.765 × 10^{4}
100. GeV 1.001 × 10^{5} 1.996  0.359  0.490  0.036  2.883  4.488 × 10^{4}
140. GeV 1.401 × 10^{5} 2.026  0.527  0.732  0.050  3.337  5.776 × 10^{4}
200. GeV 2.001 × 10^{5} 2.057  0.790  1.114  0.072  4.034  7.410 × 10^{4}
208. GeV 2.077 × 10^{5} 2.060  0.824  1.162  0.074  4.121 Muon critical energy
300. GeV 3.001 × 10^{5} 2.091  1.240  1.753  0.107  5.193  9.591 × 10^{4}
400. GeV 4.001 × 10^{5} 2.116  1.704  2.416  0.143  6.380  1.133 × 10^{5}
800. GeV 8.001 × 10^{5} 2.176  3.623  5.132  0.289  11.220  1.599 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.195  4.608  6.521  0.363  13.689  1.761 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.224  6.584  9.293  0.515  18.618  2.010 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.256  9.607  13.524  0.744  26.133  2.281 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.293  14.654  20.554  1.138  38.641  2.594 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.319  19.770  27.659  1.538  51.287  2.818 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.384  40.395  56.222  3.196 102.197  3.360 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.405  50.789  70.579  4.048 127.822  3.534 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.437  71.521  99.227  5.795 178.982  3.798 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.472 102.805 142.384  8.472 256.134  4.076 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.513 154.884 214.189  13.099 384.685  4.393 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.542 207.153 286.164  17.834 513.695  4.617 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.614 416.548 574.271  37.609 1031.043  5.156 × 10^{5}
100. TeV 1.000 × 10^{8} 2.637 521.426 718.459  47.822 1290.345  5.329 × 10^{5}