Muons in cadmium (Cd)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
48 (Cd) 112.414(4)  8.650  469.0 0.24609 2.6772 0.1281 3.1667 5.2727  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.631  4.631  1.229 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.662  3.662  2.210 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.894  2.894  4.073 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.271  2.271  8.025 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.953  1.953  1.280 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.485  1.485  3.701 × 10^{1}
100. MeV 1.764 × 10^{2} 1.402  1.403  5.090 × 10^{1}
140. MeV 2.218 × 10^{2} 1.322  1.322  8.041 × 10^{1}
200. MeV 2.868 × 10^{2} 1.283  1.283  1.266 × 10^{2}
247. MeV 3.366 × 10^{2} 1.277  1.277 Minimum ionization
300. MeV 3.917 × 10^{2} 1.281  0.000  0.000  1.281  2.048 × 10^{2}
400. MeV 4.945 × 10^{2} 1.299  0.000  0.000  1.299  2.824 × 10^{2}
800. MeV 8.995 × 10^{2} 1.382  0.001  0.000  1.383  5.805 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.415  0.001  0.000  1.417  7.233 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.469  0.002  0.000  0.001  1.471  1.000 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.527  0.003  0.001  0.001  1.532  1.399 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.592  0.005  0.003  0.001  1.601  2.037 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.637  0.007  0.005  0.002  1.651  2.651 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.740  0.017  0.016  0.003  1.777  4.977 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.771  0.022  0.023  0.004  1.820  6.089 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.815  0.034  0.037  0.005  1.891  8.244 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.858  0.052  0.060  0.008  1.979  1.134 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.904  0.086  0.105  0.011  2.107  1.624 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.935  0.121  0.154  0.015  2.226  2.085 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.003  0.274  0.369  0.029  2.675  3.721 × 10^{4}
100. GeV 1.001 × 10^{5} 2.023  0.354  0.485  0.036  2.900  4.439 × 10^{4}
140. GeV 1.401 × 10^{5} 2.053  0.520  0.723  0.051  3.349  5.722 × 10^{4}
200. GeV 2.001 × 10^{5} 2.084  0.780  1.101  0.072  4.039  7.352 × 10^{4}
213. GeV 2.126 × 10^{5} 2.090  0.835  1.179  0.076  4.181 Muon critical energy
300. GeV 3.001 × 10^{5} 2.120  1.223  1.733  0.108  5.186  9.532 × 10^{4}
400. GeV 4.001 × 10^{5} 2.145  1.682  2.388  0.144  6.360  1.127 × 10^{5}
800. GeV 8.001 × 10^{5} 2.206  3.576  5.073  0.291  11.147  1.596 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.226  4.549  6.447  0.365  13.589  1.759 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.256  6.500  9.188  0.518  18.463  2.010 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.289  9.484  13.371  0.749  25.894  2.283 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.326  14.468  20.323  1.145  38.263  2.599 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.353  19.519  27.349  1.547  50.769  2.825 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.419  39.885  55.594  3.215 101.115  3.373 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.441  50.149  69.793  4.072 126.456  3.549 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.474  70.622  98.123  5.830 177.052  3.816 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.510 101.516 140.802  8.524 253.354  4.097 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.552 152.947 211.811  13.180 380.491  4.417 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.581 204.566 282.990  17.947 508.085  4.644 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.655 411.362 567.908  37.850 1019.777  5.189 × 10^{5}
100. TeV 1.000 × 10^{8} 2.679 514.940 710.500  48.130 1276.251  5.364 × 10^{5}