Muons in butane (C_{4}H_{10})

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.59497 & 2.489 × 10^{−3} & 48.3 & 0.10852 & 3.4884 & 1.3792 & 3.7528 & 8.5651 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 9.023  9.023  6.102 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 7.024  7.024  1.118 × 10^{0}
20.0 MeV 6.802 × 10^{1} 5.475  5.475  2.097 × 10^{0}
30.0 MeV 8.509 × 10^{1} 4.239  4.239  4.202 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.615  3.615  6.773 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.705  2.706  1.998 × 10^{1}
100. MeV 1.764 × 10^{2} 2.542  2.542  2.762 × 10^{1}
140. MeV 2.218 × 10^{2} 2.380  2.381  4.396 × 10^{1}
200. MeV 2.868 × 10^{2} 2.296  2.296  6.972 × 10^{1}
266. MeV 3.567 × 10^{2} 2.278  0.000  2.278 Minimum ionization
300. MeV 3.917 × 10^{2} 2.281  0.000  2.281  1.135 × 10^{2}
400. MeV 4.945 × 10^{2} 2.307  0.000  2.307  1.572 × 10^{2}
800. MeV 8.995 × 10^{2} 2.451  0.000  0.000  2.452  3.252 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.513  0.000  0.000  2.514  4.058 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.614  0.000  0.001  2.616  5.616 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.729  0.000  0.000  0.001  2.730  7.859 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.851  0.001  0.000  0.001  2.854  1.143 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.928  0.001  0.001  0.002  2.932  1.489 × 10^{3}
8.00 GeV 8.105 × 10^{3} 3.097  0.003  0.003  0.004  3.106  2.809 × 10^{3}
10.0 GeV 1.011 × 10^{4} 3.146  0.004  0.004  0.005  3.158  3.447 × 10^{3}
14.0 GeV 1.411 × 10^{4} 3.215  0.006  0.006  0.007  3.234  4.698 × 10^{3}
20.0 GeV 2.011 × 10^{4} 3.283  0.009  0.010  0.009  3.312  6.530 × 10^{3}
30.0 GeV 3.011 × 10^{4} 3.354  0.014  0.017  0.014  3.400  9.508 × 10^{3}
40.0 GeV 4.011 × 10^{4} 3.400  0.020  0.026  0.018  3.464  1.242 × 10^{4}
80.0 GeV 8.011 × 10^{4} 3.501  0.047  0.062  0.035  3.645  2.366 × 10^{4}
100. GeV 1.001 × 10^{5} 3.531  0.061  0.083  0.043  3.718  2.909 × 10^{4}
140. GeV 1.401 × 10^{5} 3.575  0.089  0.124  0.060  3.849  3.966 × 10^{4}
200. GeV 2.001 × 10^{5} 3.620  0.135  0.190  0.085  4.031  5.489 × 10^{4}
300. GeV 3.001 × 10^{5} 3.670  0.213  0.303  0.128  4.314  7.886 × 10^{4}
400. GeV 4.001 × 10^{5} 3.705  0.295  0.421  0.170  4.592  1.013 × 10^{5}
800. GeV 8.001 × 10^{5} 3.790  0.636  0.913  0.344  5.683  1.795 × 10^{5}
1.00 TeV 1.000 × 10^{6} 3.818  0.813  1.169  0.432  6.231  2.131 × 10^{5}
1.40 TeV 1.400 × 10^{6} 3.860  1.169  1.676  0.612  7.317  2.722 × 10^{5}
1.56 TeV 1.557 × 10^{6} 3.873  1.311  1.879  0.684  7.747 Muon critical energy
2.00 TeV 2.000 × 10^{6} 3.905  1.716  2.456  0.887  8.965  3.462 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.957  2.636  3.754  1.359  11.707  4.436 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.995  3.573  5.071  1.840  14.480  5.202 × 10^{5}
8.00 TeV 8.000 × 10^{6} 4.087  7.373  10.381  3.843  25.685  7.249 × 10^{5}
10.0 TeV 1.000 × 10^{7} 4.118  9.298  13.057  4.876  31.348  7.953 × 10^{5}
14.0 TeV 1.400 × 10^{7} 4.164  13.140  18.386  7.005  42.695  9.042 × 10^{5}
20.0 TeV 2.000 × 10^{7} 4.214  18.956  26.428  10.277  59.875  1.022 × 10^{6}
30.0 TeV 3.000 × 10^{7} 4.271  28.645  39.804  15.962  88.683  1.159 × 10^{6}
40.0 TeV 4.000 × 10^{7} 4.313  38.392  53.226  21.799 117.731  1.256 × 10^{6}
80.0 TeV 8.000 × 10^{7} 4.416  77.477 106.962  46.325 235.180  1.492 × 10^{6}
100. TeV 1.000 × 10^{8} 4.449  97.073 133.863  59.049 294.436  1.568 × 10^{6}