Muons in bromine gas (Br_{2})

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
35 (Br) 79.904(1) 7.072 × 10^{−3} 343.0 0.06335 3.4670 1.5262 4.9899 11.7307 0.00
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 5.027  5.027  1.125 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.963  3.963  2.030 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.125  3.125  3.753 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.448  2.448  7.418 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.103  2.103  1.185 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.601  1.601  3.432 × 10^{1}
100. MeV 1.764 × 10^{2} 1.513  1.513  4.720 × 10^{1}
140. MeV 2.218 × 10^{2} 1.429  1.429  7.453 × 10^{1}
200. MeV 2.868 × 10^{2} 1.391  1.391  1.172 × 10^{2}
232. MeV 3.210 × 10^{2} 1.388  1.388 Minimum ionization
300. MeV 3.917 × 10^{2} 1.396  0.000  0.000  1.396  1.892 × 10^{2}
400. MeV 4.945 × 10^{2} 1.423  0.000  0.000  1.423  2.601 × 10^{2}
800. MeV 8.995 × 10^{2} 1.537  0.001  0.000  1.538  5.300 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.584  0.001  0.000  1.585  6.580 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.660  0.001  0.000  0.001  1.662  9.042 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.745  0.002  0.001  0.001  1.749  1.256 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.844  0.004  0.002  0.001  1.852  1.810 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.916  0.005  0.004  0.002  1.927  2.339 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.077  0.013  0.013  0.003  2.106  4.314 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.125  0.017  0.018  0.004  2.164  5.250 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.193  0.026  0.029  0.006  2.254  7.059 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.260  0.040  0.047  0.008  2.356  9.661 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.329  0.066  0.082  0.012  2.490  1.379 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.375  0.093  0.120  0.015  2.604  1.771 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.475  0.211  0.287  0.030  3.003  3.198 × 10^{4}
100. GeV 1.001 × 10^{5} 2.504  0.273  0.377  0.037  3.192  3.844 × 10^{4}
140. GeV 1.401 × 10^{5} 2.545  0.401  0.563  0.052  3.562  5.029 × 10^{4}
200. GeV 2.001 × 10^{5} 2.587  0.601  0.858  0.074  4.120  6.594 × 10^{4}
300. GeV 3.001 × 10^{5} 2.632  0.943  1.351  0.111  5.037  8.786 × 10^{4}
327. GeV 3.267 × 10^{5} 2.641  1.036  1.485  0.121  5.284 Muon critical energy
400. GeV 4.001 × 10^{5} 2.663  1.296  1.862  0.148  5.969  1.061 × 10^{5}
800. GeV 8.001 × 10^{5} 2.733  2.758  3.959  0.299  9.751  1.580 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.756  3.510  5.033  0.376  11.675  1.767 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.788  5.018  7.176  0.532  15.516  2.064 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.823  7.325  10.448  0.770  21.368  2.392 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.862  11.181  15.886  1.178  31.108  2.778 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.890  15.090  21.384  1.592  40.957  3.057 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.958  30.860  43.490  3.310  80.619  3.740 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.981  38.811  54.604  4.193 100.590  3.962 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.015  54.670  76.779  6.006 140.471  4.297 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.051  78.608 110.188  8.786 200.634  4.652 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.094 118.459 165.776  13.592 300.922  5.057 × 10^{5}
40.0 TeV 4.000 × 10^{7} 3.125 158.463 221.502  18.513 401.603  5.343 × 10^{5}
80.0 TeV 8.000 × 10^{7} 3.200 318.748 444.574  39.070 805.593  6.033 × 10^{5}
100. TeV 1.000 × 10^{8} 3.225 399.040 556.220  49.690 1008.176  6.254 × 10^{5}