Muons in brain (ICRP)

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.55423 & 1.030 & 73.3 & 0.08255 & 3.5585 & 0.2206 & 2.8021 & 3.4279 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.976  7.976  6.928 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 6.221  6.221  1.267 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.858  4.858  2.371 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.768  3.768  4.741 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.218  3.218  7.631 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.415  2.415  2.244 × 10^{1}
100. MeV 1.764 × 10^{2} 2.271  2.271  3.100 × 10^{1}
140. MeV 2.218 × 10^{2} 2.115  2.115  4.934 × 10^{1}
200. MeV 2.868 × 10^{2} 2.025  2.025  7.844 × 10^{1}
300. MeV 3.917 × 10^{2} 1.991  0.000  1.991  1.284 × 10^{2}
318. MeV 4.105 × 10^{2} 1.990  0.000  1.990 Minimum ionization
400. MeV 4.945 × 10^{2} 1.997  0.000  1.997  1.786 × 10^{2}
800. MeV 8.995 × 10^{2} 2.071  0.000  0.000  2.072  3.753 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.106  0.000  0.000  2.106  4.710 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.161  0.000  0.001  2.163  6.583 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.223  0.001  0.000  0.001  2.225  9.316 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.293  0.001  0.001  0.001  2.296  1.374 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.341  0.001  0.001  0.002  2.346  1.804 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.453  0.004  0.003  0.004  2.464  3.463 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.487  0.005  0.005  0.005  2.501  4.268 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.536  0.007  0.008  0.007  2.557  5.849 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.585  0.011  0.013  0.009  2.619  8.166 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.639  0.018  0.022  0.013  2.693  1.193 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.675  0.026  0.033  0.018  2.752  1.560 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.759  0.059  0.080  0.034  2.932  2.966 × 10^{4}
100. GeV 1.001 × 10^{5} 2.785  0.077  0.105  0.042  3.010  3.639 × 10^{4}
140. GeV 1.401 × 10^{5} 2.824  0.113  0.158  0.059  3.154  4.937 × 10^{4}
200. GeV 2.001 × 10^{5} 2.864  0.171  0.242  0.084  3.361  6.779 × 10^{4}
300. GeV 3.001 × 10^{5} 2.910  0.269  0.384  0.125  3.689  9.617 × 10^{4}
400. GeV 4.001 × 10^{5} 2.943  0.372  0.532  0.167  4.014  1.221 × 10^{5}
800. GeV 8.001 × 10^{5} 3.022  0.799  1.149  0.337  5.308  2.085 × 10^{5}
1.00 TeV 1.000 × 10^{6} 3.048  1.019  1.468  0.424  5.960  2.441 × 10^{5}
1.05 TeV 1.046 × 10^{6} 3.053  1.069  1.540  0.444  6.107 Muon critical energy
1.40 TeV 1.400 × 10^{6} 3.088  1.463  2.102  0.601  7.255  3.048 × 10^{5}
2.00 TeV 2.000 × 10^{6} 3.130  2.146  3.075  0.871  9.221  3.780 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.178  3.290  4.693  1.334  12.496  4.708 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.213  4.454  6.335  1.806  15.808  5.418 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.299  9.169  12.946  3.769  29.183  7.253 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.327  11.553  16.275  4.780  35.937  7.869 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.371  16.312  22.910  6.864  49.457  8.814 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.417  23.512  32.916  10.067  69.912  9.830 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.471  35.500  49.566  15.625 104.162  1.099 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.510  47.553  66.269  21.330 138.662  1.182 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.605  95.899 133.136  45.276 277.917  1.382 × 10^{6}
100. TeV 1.000 × 10^{8} 3.637 120.142 166.609  57.689 348.078  1.446 × 10^{6}