Muons in borosilicate glass (Pyrex Corning 7740)

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.49707 & 2.230 & 134.0 & 0.08270 & 3.5224 & 0.1479 & 2.9933 & 3.9708 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 6.597  6.597  8.427 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.161  5.162  1.535 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.043  4.043  2.864 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.146  3.146  5.707 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.691  2.691  9.166 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.029  2.029  2.682 × 10^{1}
100. MeV 1.764 × 10^{2} 1.907  1.907  3.701 × 10^{1}
140. MeV 2.218 × 10^{2} 1.784  1.784  5.880 × 10^{1}
200. MeV 2.868 × 10^{2} 1.716  1.716  9.321 × 10^{1}
294. MeV 3.854 × 10^{2} 1.696  0.000  1.696 Minimum ionization
300. MeV 3.917 × 10^{2} 1.696  0.000  1.696  1.520 × 10^{2}
400. MeV 4.945 × 10^{2} 1.707  0.000  1.707  2.108 × 10^{2}
800. MeV 8.995 × 10^{2} 1.784  0.000  0.000  1.785  4.400 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.817  0.000  0.000  1.818  5.510 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.871  0.000  0.000  0.001  1.872  7.676 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.929  0.001  0.000  0.001  1.931  1.083 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.995  0.001  0.001  0.001  1.999  1.591 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.041  0.002  0.002  0.002  2.046  2.085 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.145  0.005  0.005  0.004  2.158  3.982 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.176  0.006  0.006  0.005  2.194  4.901 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.221  0.010  0.011  0.006  2.248  6.701 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.267  0.015  0.017  0.009  2.309  9.333 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.316  0.025  0.030  0.013  2.384  1.359 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.348  0.035  0.045  0.017  2.446  1.773 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.424  0.080  0.108  0.033  2.645  3.343 × 10^{4}
100. GeV 1.001 × 10^{5} 2.447  0.103  0.142  0.041  2.734  4.087 × 10^{4}
140. GeV 1.401 × 10^{5} 2.482  0.152  0.212  0.057  2.904  5.506 × 10^{4}
200. GeV 2.001 × 10^{5} 2.518  0.229  0.324  0.081  3.153  7.488 × 10^{4}
300. GeV 3.001 × 10^{5} 2.560  0.360  0.514  0.122  3.557  1.047 × 10^{5}
400. GeV 4.001 × 10^{5} 2.589  0.497  0.713  0.162  3.961  1.313 × 10^{5}
731. GeV 7.311 × 10^{5} 2.651  0.963  1.388  0.299  5.302 Muon critical energy
800. GeV 8.001 × 10^{5} 2.660  1.062  1.532  0.328  5.583  2.160 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.683  1.354  1.953  0.413  6.404  2.494 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.718  1.941  2.793  0.585  8.038  3.051 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.756  2.842  4.079  0.847  10.524  3.701 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.800  4.349  6.217  1.297  14.664  4.503 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.831  5.881  8.384  1.755  18.851  5.103 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.908  12.074  17.104  3.661  35.747  6.618 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.934  15.202  21.493  4.642  44.271  7.120 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.972  21.446  30.242  6.661  61.321  7.885 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.014  30.884  43.433  9.761  87.092  8.702 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.062  46.586  65.386  15.136 130.171  9.635 × 10^{5}
40.0 TeV 4.000 × 10^{7} 3.097  62.361  87.405  20.650 173.513  1.030 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.183 125.615 175.553  43.761 348.112  1.189 × 10^{6}
100. TeV 1.000 × 10^{8} 3.211 157.323 219.676  55.730 435.941  1.241 × 10^{6}