Muons in boron oxide (B_{2}O_{3})

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.49839 & 1.812 & 99.6 & 0.11548 & 3.3832 & 0.1843 & 2.7379 & 3.6027 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 6.889  6.889  8.045 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.381  5.381  1.468 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.208  4.208  2.744 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.269  3.269  5.477 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.794  2.794  8.807 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.102  2.103  2.583 × 10^{1}
100. MeV 1.764 × 10^{2} 1.975  1.975  3.567 × 10^{1}
140. MeV 2.218 × 10^{2} 1.843  1.843  5.674 × 10^{1}
200. MeV 2.868 × 10^{2} 1.768  1.768  9.010 × 10^{1}
300. MeV 3.917 × 10^{2} 1.742  0.000  1.742  1.472 × 10^{2}
307. MeV 3.990 × 10^{2} 1.742  0.000  1.742 Minimum ionization
400. MeV 4.945 × 10^{2} 1.750  0.000  1.750  2.045 × 10^{2}
800. MeV 8.995 × 10^{2} 1.822  0.000  0.000  1.823  4.285 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.854  0.000  0.000  1.855  5.373 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.905  0.000  0.001  1.907  7.499 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.962  0.001  0.000  0.001  1.964  1.060 × 10^{3}
3.00 GeV 3.104 × 10^{3} 2.026  0.001  0.001  0.001  2.029  1.560 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.070  0.001  0.001  0.002  2.075  2.047 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.172  0.003  0.003  0.004  2.182  3.921 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.202  0.005  0.005  0.005  2.216  4.830 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.247  0.007  0.007  0.007  2.268  6.613 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.291  0.011  0.012  0.009  2.324  9.226 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.339  0.018  0.021  0.013  2.392  1.346 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.372  0.025  0.032  0.017  2.446  1.760 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.447  0.057  0.077  0.034  2.615  3.338 × 10^{4}
100. GeV 1.001 × 10^{5} 2.471  0.074  0.101  0.042  2.688  4.093 × 10^{4}
140. GeV 1.401 × 10^{5} 2.506  0.109  0.152  0.058  2.825  5.544 × 10^{4}
200. GeV 2.001 × 10^{5} 2.542  0.164  0.232  0.083  3.021  7.597 × 10^{4}
300. GeV 3.001 × 10^{5} 2.584  0.258  0.368  0.124  3.334  1.075 × 10^{5}
400. GeV 4.001 × 10^{5} 2.613  0.356  0.510  0.166  3.645  1.361 × 10^{5}
800. GeV 8.001 × 10^{5} 2.684  0.764  1.101  0.335  4.885  2.306 × 10^{5}
968. GeV 9.678 × 10^{5} 2.704  0.940  1.357  0.407  5.409 Muon critical energy
1.00 TeV 1.000 × 10^{6} 2.708  0.975  1.407  0.421  5.510  2.691 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.743  1.399  2.015  0.596  6.753  3.346 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.781  2.050  2.946  0.864  8.641  4.130 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.824  3.142  4.496  1.323  11.786  5.117 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.856  4.252  6.068  1.791  14.966  5.868 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.933  8.744  12.398  3.737  27.812  7.799 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.959  11.015  15.586  4.739  34.299  8.445 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.997  15.546  21.938  6.804  47.286  9.434 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.039  22.398  31.519  9.975  66.932  1.050 × 10^{6}
30.0 TeV 3.000 × 10^{7} 3.088  33.807  47.461  15.478  99.834  1.171 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.122  45.274  63.455  21.125 132.977  1.258 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.208  91.252 127.483  44.814 266.757  1.466 × 10^{6}
100. TeV 1.000 × 10^{8} 3.237 114.300 159.535  57.089 334.161  1.533 × 10^{6}