Muons in boron carbide (B_{4}C)

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.47059 & 2.520 & 84.7 & 0.37087 & 2.8076 & 0.0093 & 2.1006 & 2.9859 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 6.646  6.646  8.325 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.187  5.187  1.521 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.053  4.054  2.844 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.147  3.147  5.684 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.688  2.688  9.145 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.005  2.005  2.692 × 10^{1}
100. MeV 1.764 × 10^{2} 1.879  1.879  3.725 × 10^{1}
140. MeV 2.218 × 10^{2} 1.751  1.751  5.940 × 10^{1}
200. MeV 2.868 × 10^{2} 1.677  1.678  9.455 × 10^{1}
300. MeV 3.917 × 10^{2} 1.650  0.000  1.650  1.548 × 10^{2}
313. MeV 4.055 × 10^{2} 1.650  0.000  1.650 Minimum ionization
400. MeV 4.945 × 10^{2} 1.656  0.000  1.656  2.154 × 10^{2}
800. MeV 8.995 × 10^{2} 1.719  0.000  0.000  1.720  4.524 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.748  0.000  0.000  1.749  5.677 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.794  0.000  0.001  1.796  7.933 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.845  0.000  0.000  0.001  1.847  1.123 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.903  0.001  0.000  0.001  1.906  1.655 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.943  0.001  0.001  0.002  1.947  2.174 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.034  0.003  0.002  0.004  2.043  4.174 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.061  0.003  0.003  0.005  2.073  5.145 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.102  0.005  0.005  0.007  2.119  7.053 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.143  0.008  0.009  0.009  2.169  9.849 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.188  0.013  0.016  0.014  2.231  1.439 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.219  0.018  0.023  0.018  2.278  1.883 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.290  0.042  0.057  0.034  2.424  3.582 × 10^{4}
100. GeV 1.001 × 10^{5} 2.312  0.055  0.075  0.043  2.485  4.397 × 10^{4}
140. GeV 1.401 × 10^{5} 2.345  0.081  0.113  0.059  2.598  5.970 × 10^{4}
200. GeV 2.001 × 10^{5} 2.379  0.122  0.173  0.084  2.759  8.211 × 10^{4}
300. GeV 3.001 × 10^{5} 2.418  0.193  0.275  0.126  3.013  1.168 × 10^{5}
400. GeV 4.001 × 10^{5} 2.446  0.267  0.382  0.168  3.263  1.487 × 10^{5}
800. GeV 8.001 × 10^{5} 2.513  0.574  0.828  0.339  4.254  2.557 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.535  0.732  1.059  0.426  4.753  3.002 × 10^{5}
1.14 TeV 1.139 × 10^{6} 2.548  0.843  1.218  0.488  5.097 Muon critical energy
1.40 TeV 1.400 × 10^{6} 2.569  1.053  1.519  0.604  5.744  3.766 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.605  1.545  2.224  0.875  7.248  4.694 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.646  2.370  3.399  1.341  9.756  5.879 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.675  3.210  4.591  1.815  12.292  6.791 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.748  6.613  9.395  3.790  22.547  9.158 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.772  8.335  11.816  4.807  27.730  9.957 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.809  11.771  16.638  6.903  38.121  1.118 × 10^{6}
20.0 TeV 2.000 × 10^{7} 2.849  16.969  23.914  10.123  53.854  1.250 × 10^{6}
30.0 TeV 3.000 × 10^{7} 2.894  25.624  36.017  15.715  80.251  1.401 × 10^{6}
40.0 TeV 4.000 × 10^{7} 2.927  34.327  48.161  21.456 106.871  1.509 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.008  69.204  96.783  45.552 214.548  1.768 × 10^{6}
100. TeV 1.000 × 10^{8} 3.035  86.682 121.126  58.045 268.889  1.851 × 10^{6}