Muons in boron (B)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
5 (B)  10.81(7)  2.370  76.0 0.56224 2.4512 0.0305 1.9688 2.8477  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 6.610  6.610  8.365 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.155  5.155  1.529 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.023  4.023  2.862 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.117  3.117  5.725 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.657  2.657  9.223 × 10^{0}
80.0 MeV 1.527 × 10^{2} 1.977  1.977  2.723 × 10^{1}
100. MeV 1.764 × 10^{2} 1.852  1.852  3.771 × 10^{1}
140. MeV 2.218 × 10^{2} 1.724  1.724  6.021 × 10^{1}
200. MeV 2.868 × 10^{2} 1.651  1.651  9.591 × 10^{1}
300. MeV 3.917 × 10^{2} 1.623  0.000  1.624  1.572 × 10^{2}
315. MeV 4.071 × 10^{2} 1.623  0.000  1.623 Minimum ionization
400. MeV 4.945 × 10^{2} 1.629  0.000  1.629  2.187 × 10^{2}
800. MeV 8.995 × 10^{2} 1.693  0.000  0.000  1.693  4.596 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.721  0.000  0.000  1.722  5.767 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.768  0.000  0.001  1.769  8.058 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.818  0.000  0.000  0.001  1.820  1.140 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.876  0.001  0.000  0.001  1.879  1.680 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.915  0.001  0.001  0.002  1.919  2.206 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.005  0.002  0.002  0.004  2.013  4.235 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.032  0.003  0.003  0.005  2.043  5.221 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.071  0.005  0.005  0.007  2.088  7.157 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.112  0.007  0.009  0.009  2.137  9.996 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.156  0.012  0.015  0.014  2.197  1.461 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.186  0.017  0.022  0.018  2.244  1.911 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.256  0.040  0.054  0.034  2.384  3.637 × 10^{4}
100. GeV 1.001 × 10^{5} 2.278  0.052  0.071  0.043  2.444  4.466 × 10^{4}
140. GeV 1.401 × 10^{5} 2.310  0.077  0.107  0.059  2.553  6.066 × 10^{4}
200. GeV 2.001 × 10^{5} 2.344  0.116  0.164  0.084  2.708  8.347 × 10^{4}
300. GeV 3.001 × 10^{5} 2.382  0.183  0.261  0.126  2.952  1.188 × 10^{5}
400. GeV 4.001 × 10^{5} 2.410  0.253  0.362  0.168  3.193  1.514 × 10^{5}
800. GeV 8.001 × 10^{5} 2.476  0.544  0.786  0.339  4.145  2.610 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.497  0.695  1.005  0.426  4.623  3.067 × 10^{5}
1.17 TeV 1.170 × 10^{6} 2.513  0.822  1.189  0.502  5.025 Muon critical energy
1.40 TeV 1.400 × 10^{6} 2.530  0.998  1.441  0.605  5.575  3.854 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.565  1.465  2.111  0.876  7.018  4.811 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.606  2.249  3.227  1.342  9.425  6.037 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.635  3.046  4.360  1.817  11.859  6.981 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.707  6.278  8.925  3.794  21.704  9.438 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.730  7.913  11.225  4.813  26.682  1.027 × 10^{6}
14.0 TeV 1.400 × 10^{7} 2.766  11.175  15.807  6.912  36.661  1.154 × 10^{6}
20.0 TeV 2.000 × 10^{7} 2.805  16.112  22.722  10.136  51.775  1.291 × 10^{6}
30.0 TeV 3.000 × 10^{7} 2.850  24.333  34.222  15.736  77.142  1.448 × 10^{6}
40.0 TeV 4.000 × 10^{7} 2.882  32.599  45.762  21.485 102.729  1.560 × 10^{6}
80.0 TeV 8.000 × 10^{7} 2.962  65.728  91.967  45.618 206.275  1.830 × 10^{6}
100. TeV 1.000 × 10^{8} 2.988  82.330 115.100  58.130 258.549  1.916 × 10^{6}