Muons in blood (ICRP)

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.54995 & 1.060 & 75.2 & 0.08492 & 3.5406 & 0.2239 & 2.8017 & 3.4581 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.888  7.888  7.006 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 6.153  6.153  1.281 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.806  4.806  2.397 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.728  3.728  4.793 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.184  3.184  7.714 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.390  2.390  2.268 × 10^{1}
100. MeV 1.764 × 10^{2} 2.248  2.248  3.133 × 10^{1}
140. MeV 2.218 × 10^{2} 2.094  2.094  4.985 × 10^{1}
200. MeV 2.868 × 10^{2} 2.005  2.006  7.924 × 10^{1}
300. MeV 3.917 × 10^{2} 1.972  0.000  1.972  1.297 × 10^{2}
318. MeV 4.105 × 10^{2} 1.971  0.000  1.971 Minimum ionization
400. MeV 4.945 × 10^{2} 1.978  0.000  1.978  1.804 × 10^{2}
800. MeV 8.995 × 10^{2} 2.053  0.000  0.000  2.053  3.789 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.087  0.000  0.000  2.087  4.755 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.142  0.000  0.001  2.143  6.645 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.203  0.001  0.000  0.001  2.205  9.402 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.273  0.001  0.001  0.001  2.276  1.386 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.321  0.001  0.001  0.002  2.326  1.820 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.432  0.004  0.003  0.004  2.443  3.493 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.466  0.005  0.005  0.005  2.480  4.306 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.514  0.007  0.008  0.007  2.536  5.900 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.564  0.011  0.013  0.009  2.597  8.236 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.617  0.018  0.023  0.013  2.671  1.203 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.653  0.026  0.033  0.018  2.730  1.573 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.736  0.060  0.080  0.034  2.910  2.990 × 10^{4}
100. GeV 1.001 × 10^{5} 2.762  0.077  0.106  0.042  2.987  3.668 × 10^{4}
140. GeV 1.401 × 10^{5} 2.800  0.114  0.159  0.059  3.132  4.975 × 10^{4}
200. GeV 2.001 × 10^{5} 2.841  0.172  0.243  0.084  3.339  6.830 × 10^{4}
300. GeV 3.001 × 10^{5} 2.886  0.271  0.386  0.125  3.669  9.685 × 10^{4}
400. GeV 4.001 × 10^{5} 2.919  0.374  0.535  0.167  3.995  1.230 × 10^{5}
800. GeV 8.001 × 10^{5} 2.997  0.803  1.156  0.337  5.294  2.096 × 10^{5}
1.00 TeV 1.000 × 10^{6} 3.023  1.025  1.477  0.424  5.949  2.453 × 10^{5}
1.03 TeV 1.032 × 10^{6} 3.027  1.061  1.528  0.438  6.054 Muon critical energy
1.40 TeV 1.400 × 10^{6} 3.062  1.472  2.115  0.601  7.250  3.061 × 10^{5}
2.00 TeV 2.000 × 10^{6} 3.104  2.158  3.093  0.870  9.225  3.793 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.152  3.309  4.721  1.333  12.515  4.720 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.187  4.479  6.372  1.803  15.841  5.429 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.272  9.219  13.021  3.764  29.276  7.258 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.300  11.616  16.369  4.774  36.060  7.873 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.343  16.401  23.042  6.856  49.641  8.815 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.389  23.638  33.105  10.053  70.186  9.826 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.442  35.689  49.850  15.604 104.585  1.099 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.481  47.805  66.648  21.301 139.234  1.181 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.575  96.402 133.898  45.210 279.085  1.380 × 10^{6}
100. TeV 1.000 × 10^{8} 3.607 120.770 167.562  57.604 349.543  1.444 × 10^{6}