Muons in bismuth germanate (BGO) [(Bi_{2}O_{3})_{2}(GeO_{2})_{3}]

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.42065 & 7.130 & 534.1 & 0.09569 & 3.0781 & 0.0456 & 3.7816 & 5.7409 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.503  4.503  1.259 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.557  3.557  2.268 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.811  2.812  4.186 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.208  2.208  8.253 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.901  1.901  1.316 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.452  1.452  3.797 × 10^{1}
100. MeV 1.764 × 10^{2} 1.371  1.371  5.218 × 10^{1}
140. MeV 2.218 × 10^{2} 1.294  1.294  8.234 × 10^{1}
200. MeV 2.868 × 10^{2} 1.256  1.256  1.296 × 10^{2}
247. MeV 3.366 × 10^{2} 1.251  0.000  1.251 Minimum ionization
300. MeV 3.917 × 10^{2} 1.255  0.000  0.000  1.255  2.094 × 10^{2}
400. MeV 4.945 × 10^{2} 1.273  0.000  0.000  1.274  2.885 × 10^{2}
800. MeV 8.995 × 10^{2} 1.356  0.001  0.000  1.358  5.924 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.390  0.001  0.000  1.391  7.378 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.443  0.002  0.001  1.445  1.020 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.501  0.003  0.001  0.001  1.506  1.426 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.566  0.005  0.003  0.001  1.576  2.074 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.611  0.008  0.005  0.002  1.626  2.698 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.714  0.020  0.018  0.003  1.755  5.057 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.745  0.026  0.025  0.004  1.801  6.181 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.790  0.040  0.041  0.006  1.876  8.356 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.834  0.062  0.067  0.008  1.971  1.147 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.881  0.102  0.117  0.011  2.113  1.637 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.912  0.144  0.173  0.015  2.245  2.096 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.982  0.326  0.418  0.029  2.756  3.700 × 10^{4}
100. GeV 1.001 × 10^{5} 2.003  0.422  0.551  0.036  3.013  4.394 × 10^{4}
140. GeV 1.401 × 10^{5} 2.034  0.620  0.823  0.050  3.529  5.620 × 10^{4}
185. GeV 1.849 × 10^{5} 2.059  0.849  1.144  0.066  4.120 Muon critical energy
200. GeV 2.001 × 10^{5} 2.066  0.929  1.255  0.071  4.323  7.154 × 10^{4}
300. GeV 3.001 × 10^{5} 2.102  1.456  1.977  0.107  5.644  9.174 × 10^{4}
400. GeV 4.001 × 10^{5} 2.127  2.001  2.726  0.143  6.998  1.076 × 10^{5}
800. GeV 8.001 × 10^{5} 2.187  4.251  5.795  0.289  12.523  1.498 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.206  5.407  7.366  0.363  15.343  1.642 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.236  7.722  10.497  0.514  20.970  1.864 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.268  11.262  15.277  0.743  29.552  2.104 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.305  17.170  23.219  1.137  43.832  2.380 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.332  23.155  31.246  1.537  58.271  2.578 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.397  47.280  63.511  3.194 116.384  3.054 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.418  59.434  79.730  4.046 145.629  3.207 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.451  83.676 112.089  5.793 204.011  3.438 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.486 120.247 160.836  8.472 292.043  3.683 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.527 181.129 241.939  13.104 438.700  3.960 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.557 242.222 323.233  17.846 585.859  4.157 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.629 486.939 648.634  37.654 1175.858  4.629 × 10^{5}
100. TeV 1.000 × 10^{8} 2.653 609.495 811.482  47.887 1471.519  4.781 × 10^{5}