Muons in bismuth (Bi)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
83 (Bi) 208.98040(1) 9.747  823.0 0.09410 3.1671 0.4152 3.8248 6.3505  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 3.838  3.838  1.517 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.066  3.066  2.694 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.445  2.445  4.907 × 10^{0}
30.0 MeV 8.509 × 10^{1} 1.935  1.935  9.562 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.673  1.673  1.515 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.288  1.288  4.321 × 10^{1}
100. MeV 1.764 × 10^{2} 1.221  1.221  5.919 × 10^{1}
140. MeV 2.218 × 10^{2} 1.157  1.157  9.299 × 10^{1}
200. MeV 2.868 × 10^{2} 1.129  1.130  1.457 × 10^{2}
223. MeV 3.114 × 10^{2} 1.128  0.000  1.128 Minimum ionization
300. MeV 3.917 × 10^{2} 1.136  0.000  0.000  1.137  2.341 × 10^{2}
400. MeV 4.945 × 10^{2} 1.158  0.000  0.000  1.159  3.213 × 10^{2}
800. MeV 8.995 × 10^{2} 1.245  0.001  0.000  1.247  6.534 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.279  0.001  0.000  1.281  8.116 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.332  0.002  0.001  1.335  1.117 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.389  0.004  0.001  0.001  1.395  1.556 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.453  0.007  0.003  0.001  1.465  2.254 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.498  0.010  0.006  0.002  1.516  2.925 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.598  0.025  0.022  0.003  1.649  5.444 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.628  0.034  0.031  0.004  1.698  6.639 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.671  0.052  0.051  0.005  1.780  8.938 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.714  0.080  0.085  0.007  1.887  1.221 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.759  0.131  0.150  0.011  2.052  1.729 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.789  0.186  0.221  0.014  2.210  2.198 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.856  0.420  0.534  0.028  2.838  3.791 × 10^{4}
100. GeV 1.001 × 10^{5} 1.876  0.544  0.703  0.034  3.159  4.459 × 10^{4}
140. GeV 1.401 × 10^{5} 1.905  0.798  1.051  0.048  3.804  5.612 × 10^{4}
140. GeV 1.406 × 10^{5} 1.905  0.802  1.056  0.048  3.812 Muon critical energy
200. GeV 2.001 × 10^{5} 1.935  1.196  1.603  0.068  4.804  7.013 × 10^{4}
300. GeV 3.001 × 10^{5} 1.969  1.875  2.524  0.102  6.472  8.801 × 10^{4}
400. GeV 4.001 × 10^{5} 1.992  2.577  3.479  0.136  8.186  1.017 × 10^{5}
800. GeV 8.001 × 10^{5} 2.049  5.471  7.392  0.276  15.189  1.371 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.068  6.956  9.393  0.346  18.765  1.489 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.096  9.932  13.384  0.490  25.903  1.670 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.126  14.481  19.473  0.709  36.790  1.863 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.161  22.071  29.590  1.083  54.907  2.084 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.186  29.758  39.814  1.464  73.223  2.241 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.248  60.733  80.904  3.039 146.925  2.619 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.268  76.335 101.556  3.847 184.008  2.741 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.299 107.453 142.764  5.505 258.023  2.924 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.332 154.390 204.836  8.044 369.604  3.117 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.370 232.528 308.108  12.430 555.437  3.336 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.398 310.928 411.618  16.917 741.863  3.491 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.467 624.949 825.936  35.637 1488.991  3.864 × 10^{5}
100. TeV 1.000 × 10^{8} 2.489 782.200 1033.280  45.300 1863.271  3.984 × 10^{5}