Muons in beryllium oxide (BeO)

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.47979 & 3.010 & 93.2 & 0.10755 & 3.4927 & 0.0241 & 2.5846 & 2.9801 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 6.691  6.691  8.277 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.225  5.225  1.511 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.085  4.085  2.825 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.172  3.172  5.642 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.711  2.711  9.074 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.025  2.025  2.668 × 10^{1}
100. MeV 1.764 × 10^{2} 1.897  1.898  3.691 × 10^{1}
140. MeV 2.218 × 10^{2} 1.768  1.768  5.886 × 10^{1}
200. MeV 2.868 × 10^{2} 1.693  1.694  9.367 × 10^{1}
300. MeV 3.917 × 10^{2} 1.665  0.000  1.666  1.534 × 10^{2}
317. MeV 4.096 × 10^{2} 1.665  0.000  1.665 Minimum ionization
400. MeV 4.945 × 10^{2} 1.671  0.000  1.671  2.134 × 10^{2}
800. MeV 8.995 × 10^{2} 1.735  0.000  0.000  1.735  4.483 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.764  0.000  0.000  1.764  5.626 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.811  0.000  0.001  1.812  7.862 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.863  0.001  0.000  0.001  1.864  1.112 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.922  0.001  0.001  0.001  1.925  1.640 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.963  0.001  0.001  0.002  1.967  2.153 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.057  0.003  0.003  0.004  2.067  4.131 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.086  0.004  0.004  0.005  2.099  5.091 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.128  0.006  0.007  0.007  2.148  6.973 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.170  0.010  0.011  0.009  2.201  9.731 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.216  0.016  0.020  0.013  2.266  1.421 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.248  0.023  0.029  0.018  2.318  1.857 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.320  0.053  0.071  0.034  2.478  3.523 × 10^{4}
100. GeV 1.001 × 10^{5} 2.343  0.068  0.094  0.042  2.547  4.319 × 10^{4}
140. GeV 1.401 × 10^{5} 2.376  0.101  0.141  0.059  2.677  5.850 × 10^{4}
200. GeV 2.001 × 10^{5} 2.411  0.152  0.215  0.083  2.862  8.017 × 10^{4}
300. GeV 3.001 × 10^{5} 2.451  0.240  0.342  0.125  3.158  1.134 × 10^{5}
400. GeV 4.001 × 10^{5} 2.479  0.331  0.474  0.166  3.451  1.437 × 10^{5}
800. GeV 8.001 × 10^{5} 2.548  0.710  1.024  0.336  4.619  2.435 × 10^{5}
976. GeV 9.758 × 10^{5} 2.568  0.882  1.274  0.412  5.136 Muon critical energy
1.00 TeV 1.000 × 10^{6} 2.570  0.906  1.309  0.422  5.208  2.843 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.604  1.301  1.875  0.599  6.379  3.536 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.641  1.907  2.742  0.867  8.158  4.366 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.683  2.924  4.186  1.329  11.122  5.412 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.713  3.957  5.651  1.799  14.120  6.208 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.788  8.141  11.549  3.754  26.233  8.254 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.812  10.257  14.520  4.761  32.351  8.940 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.849  14.478  20.440  6.836  44.604  9.988 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.890  20.861  29.370  10.024  63.145  1.111 × 10^{6}
30.0 TeV 3.000 × 10^{7} 2.936  31.490  44.226  15.557  94.210  1.240 × 10^{6}
40.0 TeV 4.000 × 10^{7} 2.970  42.174  59.131  21.235 125.511  1.332 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.053  85.014 118.803  45.058 251.928  1.552 × 10^{6}
100. TeV 1.000 × 10^{8} 3.080 106.490 148.674  57.405 315.650  1.623 × 10^{6}