Muons in beryllium (Be)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
4 (Be) 9.0121831(5) 1.848  63.7 0.80392 2.4339 0.0592 1.6922 2.7847  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 6.491  6.491  8.504 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.058  5.058  1.556 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.945  3.945  2.915 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.054  3.054  5.836 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.603  2.603  9.406 × 10^{0}
80.0 MeV 1.527 × 10^{2} 1.940  1.940  2.778 × 10^{1}
100. MeV 1.764 × 10^{2} 1.818  1.818  3.845 × 10^{1}
140. MeV 2.218 × 10^{2} 1.694  1.694  6.136 × 10^{1}
200. MeV 2.868 × 10^{2} 1.622  1.622  9.769 × 10^{1}
300. MeV 3.917 × 10^{2} 1.595  0.000  1.595  1.600 × 10^{2}
318. MeV 4.105 × 10^{2} 1.595  0.000  1.595 Minimum ionization
400. MeV 4.945 × 10^{2} 1.600  0.000  1.600  2.227 × 10^{2}
800. MeV 8.995 × 10^{2} 1.658  0.000  1.659  4.683 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.685  0.000  0.000  1.685  5.879 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.727  0.000  0.001  1.728  8.221 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.774  0.000  0.000  0.001  1.775  1.164 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.826  0.001  0.000  0.001  1.828  1.719 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.861  0.001  0.001  0.002  1.865  2.260 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.944  0.002  0.002  0.004  1.951  4.352 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.969  0.002  0.002  0.005  1.979  5.369 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.007  0.004  0.004  0.007  2.022  7.367 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.046  0.006  0.007  0.009  2.068  1.030 × 10^{4}
30.0 GeV 3.011 × 10^{4} 2.089  0.010  0.012  0.014  2.124  1.507 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.118  0.014  0.018  0.018  2.167  1.972 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.185  0.032  0.043  0.035  2.295  3.763 × 10^{4}
100. GeV 1.001 × 10^{5} 2.206  0.042  0.057  0.043  2.348  4.624 × 10^{4}
140. GeV 1.401 × 10^{5} 2.237  0.062  0.086  0.060  2.444  6.294 × 10^{4}
200. GeV 2.001 × 10^{5} 2.269  0.093  0.132  0.085  2.579  8.683 × 10^{4}
300. GeV 3.001 × 10^{5} 2.306  0.147  0.210  0.127  2.790  1.241 × 10^{5}
400. GeV 4.001 × 10^{5} 2.332  0.204  0.292  0.169  2.997  1.587 × 10^{5}
800. GeV 8.001 × 10^{5} 2.396  0.439  0.635  0.342  3.812  2.767 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.416  0.561  0.813  0.430  4.221  3.265 × 10^{5}
1.33 TeV 1.328 × 10^{6} 2.443  0.762  1.103  0.577  4.886 Muon critical energy
1.40 TeV 1.400 × 10^{6} 2.448  0.807  1.168  0.610  5.033  4.132 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.482  1.186  1.713  0.884  6.265  5.199 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.520  1.823  2.622  1.355  8.320  6.579 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.548  2.471  3.545  1.834  10.398  7.653 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.617  5.099  7.266  3.830  18.813  1.047 × 10^{6}
10.0 TeV 1.000 × 10^{7} 2.640  6.430  9.142  4.859  23.071  1.143 × 10^{6}
14.0 TeV 1.400 × 10^{7} 2.675  9.086  12.878  6.980  31.619  1.291 × 10^{6}
20.0 TeV 2.000 × 10^{7} 2.712  13.106  18.518  10.240  44.576  1.450 × 10^{6}
30.0 TeV 3.000 × 10^{7} 2.755  19.801  27.896  15.903  66.355  1.632 × 10^{6}
40.0 TeV 4.000 × 10^{7} 2.786  26.536  37.308  21.718  88.348  1.763 × 10^{6}
80.0 TeV 8.000 × 10^{7} 2.862  53.530  74.993  46.136 177.521  2.076 × 10^{6}
100. TeV 1.000 × 10^{8} 2.888  67.060  93.860  58.800 222.608  2.176 × 10^{6}