Muons in berkelium (Bk)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
97 (Bk) [247.07031(4)] 9.860  952.0 0.25556 3.0000 0.0509 2.5000 3.9886  0.00
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 3.662  3.662  1.604 × 10^{0}
14.0 MeV 5.616 × 10^{1} 2.938  2.938  2.834 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.351  2.351  5.140 × 10^{0}
30.0 MeV 8.509 × 10^{1} 1.866  1.866  9.973 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.616  1.616  1.576 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.248  1.249  4.473 × 10^{1}
100. MeV 1.764 × 10^{2} 1.182  1.182  6.123 × 10^{1}
140. MeV 2.218 × 10^{2} 1.119  1.119  9.616 × 10^{1}
200. MeV 2.868 × 10^{2} 1.088  1.089  1.507 × 10^{2}
242. MeV 3.316 × 10^{2} 1.085  0.000  1.085 Minimum ionization
300. MeV 3.917 × 10^{2} 1.088  0.000  0.000  1.089  2.428 × 10^{2}
400. MeV 4.945 × 10^{2} 1.105  0.000  0.000  1.105  3.340 × 10^{2}
800. MeV 8.995 × 10^{2} 1.175  0.001  0.000  1.176  6.843 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.203  0.002  0.000  1.205  8.522 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.246  0.003  0.000  1.250  1.178 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.293  0.005  0.001  0.001  1.299  1.648 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.345  0.008  0.003  0.001  1.358  2.400 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.381  0.012  0.006  0.002  1.401  3.124 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.462  0.029  0.024  0.003  1.518  5.857 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.486  0.038  0.034  0.004  1.563  7.155 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.521  0.059  0.056  0.005  1.642  9.650 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.556  0.091  0.092  0.007  1.748  1.319 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.594  0.150  0.164  0.011  1.919  1.865 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.620  0.212  0.242  0.014  2.089  2.364 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.679  0.479  0.591  0.027  2.777  4.020 × 10^{4}
100. GeV 1.001 × 10^{5} 1.698  0.620  0.779  0.034  3.132  4.698 × 10^{4}
116. GeV 1.164 × 10^{5} 1.710  0.737  0.934  0.039  3.422 Muon critical energy
140. GeV 1.401 × 10^{5} 1.725  0.911  1.166  0.047  3.850  5.848 × 10^{4}
200. GeV 2.001 × 10^{5} 1.754  1.364  1.780  0.067  4.967  7.218 × 10^{4}
300. GeV 3.001 × 10^{5} 1.786  2.138  2.805  0.101  6.832  8.929 × 10^{4}
400. GeV 4.001 × 10^{5} 1.810  2.938  3.867  0.134  8.750  1.022 × 10^{5}
800. GeV 8.001 × 10^{5} 1.866  6.235  8.222  0.271  16.596  1.349 × 10^{5}
1.00 TeV 1.000 × 10^{6} 1.884  7.927  10.449  0.341  20.603  1.457 × 10^{5}
1.40 TeV 1.400 × 10^{6} 1.912  11.316  14.891  0.483  28.603  1.621 × 10^{5}
2.00 TeV 2.000 × 10^{6} 1.942  16.495  21.668  0.698  40.805  1.795 × 10^{5}
3.00 TeV 3.000 × 10^{6} 1.976  25.134  32.928  1.067  61.107  1.994 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.001  33.883  44.307  1.441  81.633  2.136 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.062  69.129  90.039  2.991 164.222  2.474 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.082  86.879 113.023  3.786 205.772  2.583 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.112 122.282 158.887  5.417 288.699  2.746 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.145 175.674 227.972  7.914 413.707  2.919 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.183 264.646 342.902  12.227 621.960  3.115 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.211 353.935 458.095  16.639 830.882  3.253 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.278 711.071 919.187  35.048 1667.586  3.586 × 10^{5}
100. TeV 1.000 × 10^{8} 2.301 889.750 1149.940  44.550 2086.543  3.693 × 10^{5}