Muons in benzene C_{6}H_{6}

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.53769 & 0.879 & 63.4 & 0.16519 & 3.2174 & 0.1710 & 2.5091 & 3.3269 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.883  7.883  7.000 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 6.144  6.144  1.281 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.795  4.795  2.399 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.717  3.717  4.801 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.172  3.172  7.733 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.379  2.379  2.276 × 10^{1}
100. MeV 1.764 × 10^{2} 2.229  2.229  3.147 × 10^{1}
140. MeV 2.218 × 10^{2} 2.075  2.076  5.015 × 10^{1}
200. MeV 2.868 × 10^{2} 1.987  1.987  7.981 × 10^{1}
300. MeV 3.917 × 10^{2} 1.952  0.000  1.952  1.307 × 10^{2}
318. MeV 4.105 × 10^{2} 1.951  0.000  1.952 Minimum ionization
400. MeV 4.945 × 10^{2} 1.958  0.000  1.958  1.819 × 10^{2}
800. MeV 8.995 × 10^{2} 2.030  0.000  0.000  2.030  3.826 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.063  0.000  0.000  2.064  4.803 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.117  0.000  0.001  2.118  6.716 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.176  0.000  0.000  0.001  2.178  9.507 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.243  0.001  0.001  0.001  2.246  1.402 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.290  0.001  0.001  0.002  2.294  1.843 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.397  0.003  0.003  0.004  2.407  3.540 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.430  0.004  0.004  0.005  2.442  4.364 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.477  0.006  0.006  0.007  2.496  5.983 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.524  0.009  0.010  0.009  2.553  8.359 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.576  0.015  0.018  0.014  2.623  1.222 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.611  0.021  0.027  0.018  2.677  1.599 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.692  0.049  0.065  0.035  2.841  3.047 × 10^{4}
100. GeV 1.001 × 10^{5} 2.718  0.063  0.086  0.043  2.910  3.743 × 10^{4}
140. GeV 1.401 × 10^{5} 2.755  0.093  0.130  0.059  3.038  5.087 × 10^{4}
200. GeV 2.001 × 10^{5} 2.795  0.141  0.199  0.084  3.219  7.005 × 10^{4}
300. GeV 3.001 × 10^{5} 2.839  0.222  0.316  0.126  3.505  9.981 × 10^{4}
400. GeV 4.001 × 10^{5} 2.871  0.307  0.439  0.168  3.786  1.273 × 10^{5}
800. GeV 8.001 × 10^{5} 2.948  0.661  0.951  0.340  4.900  2.199 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.973  0.844  1.216  0.428  5.460  2.585 × 10^{5}
1.19 TeV 1.189 × 10^{6} 2.992  1.017  1.464  0.512  5.985 Muon critical energy
1.40 TeV 1.400 × 10^{6} 3.011  1.212  1.743  0.606  6.573  3.252 × 10^{5}
2.00 TeV 2.000 × 10^{6} 3.052  1.779  2.552  0.878  8.262  4.065 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.099  2.730  3.899  1.346  11.075  5.107 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.133  3.698  5.266  1.822  13.919  5.910 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.216  7.621  10.772  3.804  25.414  8.006 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.244  9.606  13.547  4.825  31.223  8.715 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.286  13.568  19.074  6.931  42.858  9.804 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.331  19.563  27.412  10.166  60.472  1.098 × 10^{6}
30.0 TeV 3.000 × 10^{7} 3.383  29.546  41.284  15.784  89.997  1.232 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.420  39.586  55.203  21.551 119.760  1.328 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.513  79.826 110.926  45.767 240.031  1.560 × 10^{6}
100. TeV 1.000 × 10^{8} 3.544  99.994 138.821  58.325 300.684  1.634 × 10^{6}