Muons in barium sulfate BaSO_{4}

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.44561 & 4.500 & 285.7 & 0.11747 & 3.0427 & −0.0128 & 3.4069 & 4.8923 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 5.288  5.288  1.061 × 10^{0}
14.0 MeV 5.616 × 10^{1} 4.157  4.157  1.923 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.270  3.271  3.569 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.557  2.557  7.074 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.194  2.194  1.132 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.659  1.659  3.293 × 10^{1}
100. MeV 1.764 × 10^{2} 1.563  1.563  4.538 × 10^{1}
140. MeV 2.218 × 10^{2} 1.467  1.467  7.193 × 10^{1}
200. MeV 2.868 × 10^{2} 1.417  1.417  1.137 × 10^{2}
267. MeV 3.577 × 10^{2} 1.406  0.000  1.407 Minimum ionization
300. MeV 3.917 × 10^{2} 1.408  0.000  0.000  1.408  1.847 × 10^{2}
400. MeV 4.945 × 10^{2} 1.423  0.000  0.000  1.423  2.553 × 10^{2}
800. MeV 8.995 × 10^{2} 1.503  0.001  0.000  1.504  5.285 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.536  0.001  0.000  1.537  6.600 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.589  0.001  0.000  0.001  1.591  9.155 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.647  0.002  0.001  0.001  1.651  1.285 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.713  0.004  0.002  0.001  1.720  1.878 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.758  0.005  0.004  0.002  1.769  2.451 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.861  0.013  0.012  0.003  1.890  4.630 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.892  0.017  0.017  0.004  1.931  5.676 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.937  0.026  0.028  0.006  1.997  7.711 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.982  0.040  0.046  0.008  2.076  1.066 × 10^{4}
30.0 GeV 3.011 × 10^{4} 2.029  0.066  0.080  0.012  2.187  1.534 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.061  0.093  0.117  0.016  2.287  1.981 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.131  0.211  0.282  0.031  2.655  3.601 × 10^{4}
100. GeV 1.001 × 10^{5} 2.153  0.273  0.371  0.038  2.835  4.330 × 10^{4}
140. GeV 1.401 × 10^{5} 2.184  0.401  0.554  0.053  3.192  5.659 × 10^{4}
200. GeV 2.001 × 10^{5} 2.217  0.601  0.843  0.075  3.737  7.395 × 10^{4}
285. GeV 2.847 × 10^{5} 2.249  0.890  1.253  0.107  4.500 Muon critical energy
300. GeV 3.001 × 10^{5} 2.254  0.943  1.329  0.113  4.640  9.793 × 10^{4}
400. GeV 4.001 × 10^{5} 2.280  1.297  1.832  0.150  5.561  1.176 × 10^{5}
800. GeV 8.001 × 10^{5} 2.344  2.760  3.899  0.303  9.307  1.726 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.365  3.511  4.957  0.381  11.216  1.922 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.396  5.019  7.068  0.540  15.024  2.229 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.430  7.326  10.291  0.781  20.829  2.567 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.469  11.179  15.646  1.196  30.491  2.961 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.497  15.085  21.061  1.616  40.261  3.246 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.567  30.840  42.832  3.363  79.603  3.939 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.589  38.782  53.777  4.261  99.411  4.163 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.624  54.625  75.614  6.107 138.970  4.502 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.661  78.535 108.513  8.938 198.648  4.861 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.705 118.337 163.251  13.836 298.129  5.270 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.736 158.287 218.124  18.854 398.002  5.559 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.813 318.350 437.779  39.839 798.781  6.254 × 10^{5}
100. TeV 1.000 × 10^{8} 2.838 398.526 547.713  50.689 999.767  6.478 × 10^{5}